Wed 01 Jun 2005 09:12:55 AM EDT Page 1

/home/abarryd//testnewproc/940601I/940601I.adc

                                                    ANALOG CHANNEL INFORMATION
                                              Where: Channel = a + bV^1 + cV^2 + dV^3
--------------------------------------------------------------------------------------------------------------------------------
      CHANNEL NAME                                    VARIABLE              a               b               c               d
--------------------------------------------------------------------------------------------------------------------------------
 0.) J-W Liquid Water Content                           lwcjw              0.0000         1.2000         0.0000         0.0000
 1.) Rosemount Total Temp #1 FWD SN 31416/amp #11 cal d tt1               -0.5866        12.1444         0.0000         0.0000
 2.) Rosemount Total Temp #2 AFT SN 58171/amp #151 cal  tt2               -0.3371        12.1299         0.0000         0.0000
 3.) General Eastern Dewpoint sn 52723/92616 cal date 0 tdm1             -16.9232        11.1396         0.0000         0.0000
 4.) Attack Pressure Fuselage  SN 877 CAL DATE 042894   pdaf               0.0109         6.8814         0.0000         0.0000
 5.) Dynamic Attack Pressure Fuselage  SN 860 CAL DATE  pqaf              -0.3073        17.2381         0.0000         0.0000
 6.) Sideslip Pressure Fuselage SN 878 CAL DATE 042894  pdsf              -0.0180         6.8855         0.0000         0.0000
 7.) Dynamic Sideslip Pressure Fus SN 861 CAL DATE 0428 pqsf               0.2299        17.1699         0.0000         0.0000
 8.) Static Pressure Wingtip SN 162 CAL DATE 042894     psw              250.3613        79.9747         0.0000         0.0000
 9.) Dynamic Pressure Wingtip SN 162 CAL DATE 042894    pqw                0.9419        16.5160         0.0000         0.0000
10.) Surface PRT-5 Radiometer  L.Fus SN 588 CAL DATE  trdprt5           -1.1522        11.4749        -0.6993         0.0475
11.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
12.) Radiometric Air Temp (Side) SN 650 CAL DATE 042894 tsrdco2            8.3481         7.7495        -0.1852         0.0170
13.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
14.) Vertical Acceleration - INE 2                      azi2               0.0000         4.9031         0.0000         0.0000
15.) Vertical Acceleration - INE 1                      azi1               0.0000         4.9031         0.0000         0.0000
16.) Attack Pressure Radome SN 285 CAL DATE 042894      pdar               0.0353         6.9090         0.0000         0.0000
17.) Sideslip Pressure Radome SN 879 CAL DATE 042894    pdsr              -0.0581         6.8913         0.0000         0.0000
18.) Dynamic Pressure Radome SN 862 CAL DATE 042894     pqr                0.2331        17.2631         0.0000         0.0000
19.) Total Pressure Radome SN 260 CAL DATE 042994       ptr               -1.3051       206.8938         0.0000         0.0000
20.) x                                                  x                  0.0401        11.0000         0.0000         0.0000
21.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
22.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
23.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
24.) AOC SN 1 w/842 CAL DATE  050294                    tdm2              -0.7136        10.0230         0.0000         0.0000
25.) dewpoint #2 balance                                tdm2bal           -5.0000         1.0000         0.0000         0.0000
26.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
27.) x                                                  x                -49.6200        19.9740         0.0000         0.0000
28.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
29.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
30.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
31.) King Liquid water                                  klwc               0.0000         1.0000         0.0000         0.0000
32.) Static Pressure Fuselage SN 161 CAL DATE 042894    psf              250.0135        79.9834         0.0000         0.0000
33.) Dynamic Pressure #1 Fuselage SN 161 CAL DATE 04289 pqf1               0.0722        16.5100         0.0000         0.0000
34.) Dynamic Pressure #2 Fuselage SN 287 CAL DATE 04289 pqf2              -1.8100        34.5685         0.0000         0.0000
35.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
36.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
37.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
38.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
39.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
40.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
41.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
42.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
43.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
44.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
45.) x                                                  x                  0.0000         1.0000         0.0000         0.0000

Wed 01 Jun 2005 09:12:55 AM EDT Page 2

/home/abarryd//testnewproc/940601I/940601I.adc

46.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
47.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
48.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
49.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
50.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
51.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
52.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
53.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
54.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
55.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
56.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
57.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
58.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
59.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
60.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
61.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
62.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
63.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
64.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
65.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
66.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
67.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
68.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
69.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
70.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
71.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
72.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
73.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
74.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
75.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
76.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
77.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
78.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
79.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
--------------------------------------------------------------------------------------------------------------------------------
                                                    ANALOG CHANNEL INFORMATION
                                            Retrieved from /home/abarryd/testnewproc/n43_vtx94.adc
--------------------------------------------------------------------------------------------------------------------------------