Tue 11 Sep 2007 10:07:03 AM EDT Page 1

/acdata/2007//hur07/070901H/070901H.adc

                                                    ANALOG CHANNEL INFORMATION
                                              Where: Channel = a + bV^1 + cV^2 + dV^3
--------------------------------------------------------------------------------------------------------------------------------
      CHANNEL NAME                                    VARIABLE              a               b               c               d
--------------------------------------------------------------------------------------------------------------------------------
 0.) Liquid Water Content J-W Fuselage                  lwcjw              0.0000         1.2000         0.0000         0.0000
 1.) Rosemount Total Temp#1 FWD sn 34212 w/ amp #11 cal tt1               -0.3668        12.0281         0.0000         0.0000
 2.) Rosemount Total Temp#2 AFT  sn 94163 w/ amp #137 c tt2               -0.1269         7.0199         0.0000         0.0000
 3.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
 4.) Differential Attack Pressure Fuselage Rosemount sn pdaf              -0.0891         6.8841         0.0000         0.0000
 5.) Dynamic Attack Pressure Fuselage Rosemount sn 832  pqaf               0.0619        17.2018         0.0000         0.0000
 6.) Differential Sideslip Pressure Fuselage Rosemount  pdsf              -0.3937         6.8804         0.0000         0.0000
 7.) Dynamic Sideslip Pressure Fuselage Rosemount sn 83 pqsf              -3.4546        17.2594         0.0000         0.0000
 8.) Static Pressure PS Wingtip Rosemount sn 160 cal da psw              252.3303        79.9324         0.0000         0.0000
 9.) Dynamic Pressure PQ Wingtip Rosemount sn 160 cal d pqw               -0.4328        16.4925         0.0000         0.0000
10.) SST Down Radiometer Heitronics KT-19.85II sn 2486  prt5_down        -20.0000         6.0000         0.0000         0.0000
11.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
12.) Side Radiometer Barnes PRT-5 sn 642 cal date 7/19/ prt5_side         -0.3004        11.2148        -0.5319         0.0553
13.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
14.) Vertical Acceleration - INE 2                      acci2              0.0000         4.9031         0.0000         0.0000
15.) Vertical Acceleration - INE 1                      acci1              0.0000         4.9031         0.0000         0.0000
16.) Differential Attack Pressure Radome Rosemount sn 2 pdar              -0.1269         6.8836         0.0000         0.0000
17.) Differential Sideslip Pressure Radome Rosemount sn pdsr               0.1240         7.4727         0.0000         0.0000
18.) Dynamic Pressure Radome Rosemount sn 658 cal date  pqr               -0.3659        34.4793         0.0000         0.0000
19.) Total Pressure Radome Rosemount sn 227 cal date 5/ ptr                6.8259       206.6115         0.0000         0.0000
20.) Rosemount Total Temp#3 sn 3081 w/ amp 124 cal date tt3                0.0000         1.0000         0.0000         0.0000
21.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
22.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
23.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
24.) EdgeTech Dewpoint #2 Vigilant sn 31279 w/ 1765 cal tdm2             -60.0000        20.0000         0.0000         0.0000
25.) Buck Research 1011C Dewpoint #1 sn 316P/316S cal d tdm1             -75.0000        12.5000         0.0000         0.0000
26.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
27.) Maycomm Dewpointer TDL sn 2 cal date 6/30/06       tdm3             -25.0000         7.5000         0.0000         0.0000
28.) dewpt#1 Buck 1011C balance                         tdm1bal           -5.0000         1.0000         0.0000         0.0000
29.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
30.) Maycomm Inst. WVSS-II sn 1 cal date 5/23/07        wvss               0.0000       8000.0000         0.0000         0.0000
31.) King Liquid water                                  klwc               0.0000         1.0000         0.0000         0.0000
32.) Static Pressure Fuselage Rosemount sn 165 cal date psf              249.7137        79.8836         0.0000         0.0000
33.) Dynamic Pressure #1 Fuselage Rosemount sn 165 cal  pqf1               1.5007        16.5476         0.0000         0.0000
34.) Dynamic Pressure #2 Fuselage Rosemount sn 860 cal  pqf2              -1.3242        17.3306         0.0000         0.0000
35.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
36.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
37.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
38.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
39.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
40.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
41.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
42.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
43.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
44.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
45.) x                                                  x                  0.0000         1.0000         0.0000         0.0000

Tue 11 Sep 2007 10:07:03 AM EDT Page 2

/acdata/2007//hur07/070901H/070901H.adc

46.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
47.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
48.) axbt1                                              axbt1              0.0000        10.0000         0.0000         0.0000
49.) axbt2                                              axbt2              0.0000        10.0000         0.0000         0.0000
50.) axbt3                                              axbt3              0.0000        10.0000         0.0000         0.0000
51.) carsey ozone                                       carsey             0.0000         1.0000         0.0000         0.0000
52.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
53.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
54.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
55.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
56.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
57.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
58.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
59.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
60.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
61.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
62.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
63.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
64.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
65.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
66.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
67.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
68.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
69.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
70.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
71.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
72.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
73.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
74.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
75.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
76.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
77.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
78.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
79.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
--------------------------------------------------------------------------------------------------------------------------------
                                                    ANALOG CHANNEL INFORMATION
                                            Retrieved from /acdata/adc/2007/n42_hur07v2.adc
--------------------------------------------------------------------------------------------------------------------------------