, Wed Jun 20 14:46:50 2007

06/19/2007 UTC, 12:41:01-12:45:00

Deg C

UTC 12:41:01 12:41:48 12:42:36 12:43:24 12:44:12 12:45:00

21.500

21.625

21.750

21.875

22.000 prt5_down

degrees

UTC 12:41:01 12:41:48 12:42:36 12:43:24 12:44:12 12:45:00 -30

-15

0

15

30 rolli1

meters

UTC 12:41:01 12:41:48 12:42:36 12:43:24 12:44:12 12:45:00

450.0

456.2

462.5

468.8

475.0 ra159 ra232