A. Barry Damiano, Tue Aug 24 07:14:52 2004

N43RF NAME Flt #9

08/02/2004 UTC, 17:25:00-23:31:00

Deg C

UTC 17:25 18:38 19:51 21:04 22:17 23:31 -20

-12

-5

2

10

17

25

32

40

tdm3 (Deg C), 1 s/sec 24.45 10.64 -8.79 38.58 tdm2 (Deg C), 1 s/sec 12.59 8.91 -15.47 28.31 tdm1 (Deg C), 1 s/sec 12.19 8.71 -11.98 29.84 mean sigma min max