A. Barry Damiano, Tue Aug 24 07:33:10 2004

N43RF NAME Flt #6

07/23/2004 UTC, 12:54:00-20:47:00

Deg C

-10 -1 6 15 23 31 40 tdm3 tdm2 tdm1

water vapor

UTC 12:54 14:28 16:03 17:37 19:12 20:47 0 8333

16666

25000

33333

41666

50000 wvssll