A. Barry Damiano, Tue Aug 24 07:32:30 2004

N43RF NAME Flt #6

07/23/2004 UTC, 12:54:00-20:47:00

Deg C

UTC 12:54 14:28 16:03 17:37 19:12 20:47 -5

0

6

11

17

23

28

34

40

tdm3 (Deg C), 1 s/sec 27.78 5.40 6.16 37.90 tdm2 (Deg C), 1 s/sec 16.50 5.24 -2.13 26.31 tdm1 (Deg C), 1 s/sec 15.99 5.25 -3.38 29.16 mean sigma min max