Fri 29 Apr 2005 05:01:00 PM EDT Page 1

/acdata/2002/hur02/020921I/020921I.adc

                                                    ANALOG CHANNEL INFORMATION
                                              Where: Channel = a + bV^1 + cV^2 + dV^3
--------------------------------------------------------------------------------------------------------------------------------
      CHANNEL NAME                                    VARIABLE              a               b               c               d
--------------------------------------------------------------------------------------------------------------------------------
 0.) Liquid Water Content J-W Fuselage                  lwcjw              0.0000         1.2000         0.0000         0.0000
 1.) Rosemount Total Temp#1 FWD sn31416 w/ amp #11 cal  tt1               -0.4954        12.0545         0.0000         0.0000
 2.) Rosemount Total Temp#2 AFT  sn A7775 w/ amp #152 c tt2               -0.1061         7.0037         0.0000         0.0000
 3.) General Eastern TD#1 sn 52723 w/ 93602 cal date 7/ tdm1             -16.9743        11.2793         0.0000         0.0000
 4.) Differential Attack Pressure Fuselage Rosemount sn pdaf               0.0481         6.8844         0.0000         0.0000
 5.) Dynamic Attack Pressure Fuselage Rosemount sn 842  pqaf              -0.1001        17.2518         0.0000         0.0000
 6.) Differential Sideslip Pressure Fuselage Rosemount  pdsf              -0.0330         6.8889         0.0000         0.0000
 7.) Dynamic Sideslip Pressure Fuselage Rosemount sn 86 pqsf               0.2313        17.1507         0.0000         0.0000
 8.) Static Pressure Wingtip Rosemount sn 163 cal date  psw              250.0853        79.9790         0.0000         0.0000
 9.) Dynamic Pressure Wingtip Rosemount sn 163 cal date pqw               -7.8935        16.6928         0.0000         0.0000
10.) Surface SST Barnes sn 588 cal date 7/11/02         prt5_down          2.9437        10.1014        -0.5919         0.0431
11.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
12.) Side CO2 radiometer Barnes sn 650 cal date 7/11/02 prt5_side          0.0000         1.0000         0.0000         0.0000
13.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
14.) Vertical Acceleration - INE 2                      acci2              0.0000         4.9031         0.0000         0.0000
15.) Vertical Acceleration - INE 1                      acci1              0.0000         4.9031         0.0000         0.0000
16.) Differential Attack Pressure Radome Rosemount sn 2 pdar              -0.1368         6.8775         0.0000         0.0000
17.) Differential Sideslip Pressure Radome Rosemount sn pdsr              -0.0864         6.8876         0.0000         0.0000
18.) Dynamic Pressure Radome Rosemount sn 286 cal date  pqr               -0.4524        34.5438         0.0000         0.0000
19.) Total Pressure Radome Rosemount sn 260 cal date 7/ ptr               -2.4745       206.8961         0.0000         0.0000
20.) Rosemount Total Temp#3 Radome sn A29935 w/ amp 155 tt3               -0.5957         7.0003         0.0000         0.0000
21.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
22.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
23.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
24.) EdgeTech Dewpoint #2 Fuselage sn 484 w/ 1705 cal d tdm2            -100.0901        30.0300         0.0000         0.0000
25.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
26.) Lyman Alpha                                        lyman              0.0000         1.0000         0.0000         0.0000
27.) Buck sn 316-P w/ 93002 cal date 7/11/02            tdm3             -75.0000        12.5000         0.0000         0.0000
28.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
29.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
30.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
31.) King Liquid water                                  klwc               0.0000         1.0000         0.0000         0.0000
32.) Static Pressure Fuselage Rosemount sn 161 cal date psf              249.6578        79.9686         0.0000         0.0000
33.) Dynamic Pressure #1 Fuselage Rosemount sn 161 cal  pqf1              -0.2575        16.5416         0.0000         0.0000
34.) Dynamic Pressure #2 Fuselage Rosemount sn 862 cal  pqf2               0.1285        17.2312         0.0000         0.0000
35.) TT1 heater current                                 hctt1              0.0000         1.0000         0.0000         0.0000
36.) TT2 heater current                                 hctt2              0.0000         1.0000         0.0000         0.0000
37.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
38.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
39.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
40.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
41.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
42.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
43.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
44.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
45.) x                                                  x                  0.0000         1.0000         0.0000         0.0000

Fri 29 Apr 2005 05:01:00 PM EDT Page 2

/acdata/2002/hur02/020921I/020921I.adc

46.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
47.) Cabin Pressure Vaisala sn PTB 220 W3120002 cal dat pcab             500.0000       120.0000         0.0000         0.0000
48.) AXBT channel 1                                     axbt1              0.0000        10.0000         0.0000         0.0000
49.) AXBT channel 2                                     axbt2              0.0000        10.0000         0.0000         0.0000
50.) AXBT channel 3                                     axbt3              0.0000        10.0000         0.0000         0.0000
51.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
52.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
53.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
54.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
55.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
56.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
57.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
58.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
59.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
60.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
61.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
62.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
63.) Up PRT-5 radiometer                                urad               0.0000         1.0000         0.0000         0.0000
64.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
65.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
66.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
67.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
68.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
69.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
70.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
71.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
72.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
73.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
74.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
75.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
76.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
77.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
78.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
79.) x                                                  x                  0.0000         1.0000         0.0000         0.0000
--------------------------------------------------------------------------------------------------------------------------------
                                                    ANALOG CHANNEL INFORMATION
                                            Retrieved from /acdata/2002/hur02/020921I/n43_hur02.adc
--------------------------------------------------------------------------------------------------------------------------------