Wed Sep 5 09:40:16 2001 Page 1

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

13:56:01  27 50.9   -82 29.6     0.0    -0.0    0.0  314.4   -1.0   -0.1  1021.0    0.2     0.2    -0.0   33.0   18.4    15.1      -6* -3.5
13:56:02  27 50.9   -82 29.6     0.0    -0.0    0.0  314.4   -0.9   -0.2  1020.9    0.3    -0.0     0.0    0.0   18.8    14.6       1  -2.2
13:56:02  27 51.0   -82 29.6     0.0     0.0    0.0                                 0.2     0.1     0.1    0.2   28.7    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

13:56:31  27 50.9   -82 29.6     0.0    -0.0    0.0  314.3   -1.0   -0.1  1020.9    0.1     0.2    -0.0   33.0   18.3    15.1      -6* -3.5
13:56:32  27 50.9   -82 29.6     0.0    -0.0    0.0  314.4   -1.0   -0.2  1020.9    0.3     0.0     0.1    0.0   18.7    14.7       1  -2.1
13:56:32  27 51.0   -82 29.6     0.0     0.0    0.0                                 0.2     0.1     0.1    0.2   28.9    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

13:58:00  27 50.9   -82 29.7    -3.2    -3.4    4.6  223.2   -1.5    0.0  1020.9    0.2     0.4    -0.0   33.0   18.0    14.9      -6* -3.5
13:58:01  27 50.9   -82 29.7    -3.2    -3.4    4.6  223.2   -1.5   -0.1  1021.0    0.4     0.1    -0.2    0.0   18.5    13.6       1  -2.2
13:58:01  27 50.9   -82 29.7    -3.2    -3.4    4.7                                 0.2     0.4    -0.2    0.2   28.8    -0.0      11  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

13:58:30  27 50.9   -82 29.7    -3.7     1.4    3.9  294.3   -2.0   -0.3  1020.9    0.3     0.3    -0.0   33.0   18.3    14.5      -6* -3.5
13:58:31  27 50.9   -82 29.7    -3.7     1.4    4.0  294.3*  -2.0   -0.4  1020.9    0.4     0.0    -0.1    0.0   18.7    12.3       1  -2.4
13:58:31  27 50.9   -82 29.7    -3.8     1.4    4.0                                 0.1     0.2     0.1    0.2   29.0    -0.0      11  -3.3
00000000   0  0.0     0  0.0                                                                                                        0

13:59:00  27 50.9   -82 29.8    -6.8     6.2    9.2  312.2   -1.5    0.2  1020.9    0.4     0.5    -0.0   33.1   17.9    14.9      -6* -3.5
13:59:01  27 50.9   -82 29.8    -6.8     6.2    9.2  312.2*  -1.6    0.1  1021.0    0.5     0.2    -0.0    0.0   18.5    14.5       1  -2.2
13:59:01  27 51.0   -82 29.8    -6.7     6.2    9.1                                 0.2     0.4     0.6    0.2   29.0    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

13:59:30  27 51.0   -82 29.9    -5.9     6.1    8.5  315.6   -0.8    0.5  1020.7    0.4     0.6    -0.0   33.1   17.9    15.0      -6* -3.5
13:59:31  27 51.0   -82 29.9    -5.9     6.1    8.5  315.7*  -0.8    0.3  1020.9    0.5     0.1     0.1    0.0   18.4    13.6       1  -2.2
13:59:31  27 51.1   -82 29.9    -6.0     6.1    8.6                                 0.2     0.4     0.2    0.2   28.7    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:00:00  27 51.1   -82 30.0    -3.9    -3.9    5.5  225.1   -0.8   -0.1  1020.8    0.3     0.5    -0.0   33.1   18.2    15.0      -6* -3.5
14:00:01  27 51.1   -82 30.0    -3.9    -3.8    5.5  225.1   -0.8   -0.2  1020.8    0.5     0.1     0.0    0.0   18.8    13.8       1  -2.1
14:00:01  27 51.1   -82 30.0    -3.9    -3.8    5.4                                 0.2     0.3    -0.5    0.2   29.0    -0.0      10  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:00:30  27 51.0   -82 30.1    -5.3    -5.2    7.4  225.6   -0.8   -0.3  1020.7    0.4     0.6    -0.0   33.1   17.8    15.4      -6* -3.7
14:00:31  27 51.0   -82 30.1    -5.3    -5.2    7.4  225.7   -0.8   -0.4  1020.8    0.6     0.1     0.0    0.0   18.4    14.7       1  -3.8
14:00:31  27 51.1   -82 30.1    -5.3    -5.1    7.4                                 0.1     0.4    -0.8    0.2   28.8    -0.0       9  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:01:00  27 50.9   -82 30.2    -7.3    -7.2   10.3  225.5   -0.7   -0.1  1020.8    0.6     0.8    -0.0   33.1   17.7    15.7      -6* -3.5
14:01:01  27 50.9   -82 30.2    -7.4    -7.2   10.3  225.5   -0.7   -0.2  1020.9    0.8     0.4    -0.0    0.0   18.2    15.0       1  -2.2
14:01:01  27 51.0   -82 30.2    -7.4    -7.2   10.3                                 0.2     0.7    -0.9    0.2   29.0    -0.0       6  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:01:30  27 50.8   -82 30.3    -5.6    -5.7    8.0  224.3   -0.6   -0.0  1020.4   -0.7*    0.8    -0.0   33.2   18.5    15.6      -6* -3.5
14:01:31  27 50.8   -82 30.3    -5.6    -5.7    8.0  224.3   -0.7   -0.1  1020.9   -0.5*    0.1    -1.1    0.0   19.1    15.2       1  -2.2
14:01:31  27 50.9   -82 30.3    -5.7    -5.7    8.1                                 0.2     0.5    -1.8    0.2   29.0    -0.0       5  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 2

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:02:00  27 50.7   -82 30.4    -0.0    -0.0    0.0  224.8   -0.8   -0.1  1020.6    0.1     0.2    -0.0   33.1   19.0    15.3      -6* -3.5
14:02:01  27 50.7   -82 30.4    -0.0    -0.0    0.0  224.9   -0.8   -0.2  1020.8    0.2    -0.0    -0.0    0.0   19.7    13.7       1  -2.2
14:02:01  27 50.8   -82 30.4    -0.0    -0.0    0.0                                 0.2     0.1     0.0    0.2   29.0    -0.0       7  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:02:30  27 50.7   -82 30.4     0.0    -0.0    0.0  224.8   -1.5   -0.0  1020.4   -0.2*    0.2    -0.0   33.1   18.9    15.1      -6* -3.5
14:02:31  27 50.7   -82 30.4    -0.0     0.0    0.0  224.8   -1.5   -0.2  1021.1   -0.0*    0.0    -0.4    0.0   19.3    14.4       1  -2.3
14:02:31  27 50.8   -82 30.4    -0.0    -0.0    0.0                                 0.2     0.2    -0.2    0.2   28.9    -0.0       9  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:03:00  27 50.7   -82 30.4    -0.6    -0.6    0.8  225.0   -0.7   -0.0  1020.7    0.2     0.1    -0.0   33.1   19.1    15.0      -6* -3.5
14:03:01  27 50.7   -82 30.4    -0.6    -0.6    0.9  225.0   -0.7   -0.1  1020.7    0.3    -0.0    -0.0    0.0   19.6    14.1       1  -2.2
14:03:01  27 50.8   -82 30.4    -0.6    -0.6    0.8                                 0.2     0.1    -0.1    0.2   29.0    -0.0      10  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:03:30  27 50.7   -82 30.4    -6.0    -5.9    8.4  226.3   -0.7    0.1  1020.7    0.5     0.7    -0.0   33.1   18.1    15.5      -6* -3.5
14:03:31  27 50.7   -82 30.4    -6.0    -5.9    8.4  226.3*  -0.8   -0.0  1020.8    0.6     0.2    -0.0    0.0   18.6    15.7       1  -2.3
14:03:31  27 50.8   -82 30.4    -6.0    -6.0    8.5                                 0.1     0.5    -0.8    0.2   29.0    -0.0      10  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:04:00  27 50.7   -82 30.6   -12.9     0.1   12.9  270.2   -0.4   -0.2  1020.7    0.8     1.0    -0.0   33.2   17.9    15.7      -6* -3.5
14:04:01  27 50.7   -82 30.6   -13.0     0.1   13.0  270.2   -0.4   -0.4  1020.8    1.0     0.6    -0.1    0.0   18.4    15.3       1  -2.3
14:04:01  27 50.7   -82 30.6   -13.0     0.0   13.0                                 0.2     0.9    -0.1    0.2   29.1    -0.0       7  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:04:30  27 50.7   -82 30.9   -14.2    -0.0   14.2  269.7   -0.5   -0.1  1020.3    1.1     1.5    -0.0   33.2   18.0    15.4      -6* -3.5
14:04:31  27 50.7   -82 30.9   -14.2    -0.0   14.2  269.8   -0.4   -0.3  1020.6    1.3     0.6     0.4    0.0   18.5    15.1       1  -2.1
14:04:31  27 50.7   -82 30.9   -14.3    -0.1   14.3                                 0.2     1.0     0.2    0.2   28.8    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:05:00  27 50.7   -82 31.1   -11.3    -0.1   11.3  269.5   -0.5   -0.3  1020.5    0.6     0.9    -0.0   33.2   18.1    15.5      -6* -3.5
14:05:01  27 50.7   -82 31.1   -11.3    -0.1   11.3  269.5   -0.5   -0.4  1020.7    0.8     0.3     0.2    0.0   18.7    14.8       1  -2.2
14:05:01  27 50.7   -82 31.1   -11.3    -0.0   11.3                                 0.2     0.6    -0.0    0.2   29.0    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:05:30  27 50.7   -82 31.3   -10.8    -0.3   10.8  267.9   -0.7   -0.5  1020.5    0.6     0.8    -0.0   33.2   18.3    15.6      -6* -3.5
14:05:31  27 50.7   -82 31.3   -10.8    -0.3   10.8  267.9*  -0.7   -0.6  1020.8    0.8     0.2     0.3    0.0   18.8    15.1       1  -2.2
14:05:31  27 50.7   -82 31.3   -10.9    -0.3   10.9                                 0.2     0.6    -0.5    0.2   29.1    -0.0      12  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:06:00  27 50.6   -82 31.4    -6.4    -7.7   10.0  219.6   -0.7   -0.2  1020.6    0.8     0.9    -0.0   33.2   18.4    15.7      -6* -3.5
14:06:01  27 50.6   -82 31.4    -6.4    -7.7   10.1  219.6   -0.7   -0.4  1020.8    0.9     0.4     0.3    0.0   19.0    15.4       1  -2.2
14:06:01  27 50.6   -82 31.4    -6.4    -7.8   10.1                                 0.2     0.8    -1.1    0.2   29.0    -0.0      10  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:06:30  27 50.5   -82 31.5    -0.5     0.4    0.7  310.1   -1.1   -0.3  1020.8   -0.0*    0.2    -0.0   33.3   19.2    15.6      -6* -3.5
14:06:31  27 50.5   -82 31.5    -0.5     0.4    0.7  310.1   -1.1   -0.4  1020.9    0.1    -0.0    -0.0    0.0   19.8    14.3       1  -2.2
14:06:31  27 50.6   -82 31.5    -0.7     0.6    0.9                                 0.2     0.1     0.1    0.2   29.0    -0.0       9  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 3

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:07:00  27 50.5   -82 31.5     0.0     0.0    0.0  310.1   -0.9   -0.2  1020.8    0.1     0.2    -0.0   33.2   19.6    15.6      -6* -3.5
14:07:01  27 50.5   -82 31.5     0.0    -0.0    0.0  310.1   -0.9   -0.3  1020.9    0.2    -0.0    -0.2    0.0   20.1    14.9       1  -2.2
14:07:01  27 50.6   -82 31.5     0.0     0.0    0.0                                 0.1     0.1     0.1    0.2   29.0    -0.0       7  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:07:30  27 50.5   -82 31.5     0.0     0.0    0.0  310.1   -0.9   -0.2  1020.8    0.1     0.2    -0.0   33.2   19.7    15.6      -6* -3.5
14:07:31  27 50.5   -82 31.5     0.0    -0.0    0.0  310.1   -0.9   -0.4  1020.9    0.3    -0.0    -0.0    0.0   20.2    15.1       1  -2.2
14:07:31  27 50.6   -82 31.5    -0.0     0.0    0.0                                 0.1     0.1     0.1    0.2   29.0    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:08:00  27 50.5   -82 31.5    -2.2     1.9    2.9  310.8   -0.7   -0.2  1020.8    0.1     0.3    -0.0   33.2   19.7    15.5      -6* -3.5
14:08:01  27 50.5   -82 31.5    -2.2     1.9    2.9  310.8   -0.7   -0.3  1020.9    0.2    -0.0    -0.0    0.0   20.1    14.9       1  -2.2
14:08:01  27 50.6   -82 31.5    -2.2     1.9    2.9                                 0.1     0.1     0.2    0.2   29.1    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:08:30  27 50.6   -82 31.6     1.9     2.6    3.2   36.3   -1.2   -0.1  1020.7   -0.1*    0.4    -0.0   33.3   18.8    15.5      -6* -3.5
14:08:31  27 50.6   -82 31.6     1.9     2.6    3.2   36.3   -1.2   -0.2  1020.9    0.1     0.2    -0.2    0.0   19.2    15.1       1  -2.2
14:08:31  27 50.7   -82 31.5     2.0     2.8    3.5                                 0.1     0.3     0.9    0.2   29.0    -0.0       8  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:09:00  27 50.6   -82 31.6     0.1     0.0    0.1   37.0   -1.0   -0.0  1020.8   -0.1*    0.2    -0.0   33.3   18.8    15.6      -6* -3.5
14:09:01  27 50.6   -82 31.6     0.0    -0.0    0.0   37.0   -1.0   -0.2  1020.7    0.0     0.1     0.3    0.0   19.2    14.9       1  -2.2
14:09:01  27 50.7   -82 31.5    -0.0    -0.0    0.0                                 0.1     0.1     0.5    0.2   29.0    -0.0       3  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:09:30  27 50.6   -82 31.6     0.1     0.0    0.1   37.0   -1.0   -0.1  1020.7   -0.0*    0.3    -0.0   33.2   18.9    15.6      -6* -3.5
14:09:31  27 50.6   -82 31.6     0.0    -0.0    0.0   37.0   -1.0   -0.2  1020.8    0.1     0.0    -0.0    0.0   19.3    15.1       1  -2.2
14:09:31  27 50.7   -82 31.5     0.0    -0.0    0.0                                 0.1     0.2     0.5    0.2   29.0    -0.0       3  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:10:00  27 50.9   -82 31.2    38.4    44.8   59.0   41.4   -2.3   -1.0  1020.1   21.6    23.0    -0.0   32.9   19.6    15.5       1  -3.5
14:10:01  27 50.9   -82 31.2    38.4    44.8   59.0   41.4   -2.3   -1.1  1021.7   21.7    24.3   -11.4    0.0   20.2    15.3       1  -2.2
14:10:01  27 51.0   -82 31.2    38.0    44.7   58.7                                 0.1    24.5     5.3    0.2   29.1    -0.0       6  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:10:30  27 51.8   -82 30.3    65.7    55.9   86.3   55.9    5.3   14.2  1007.0   45.6    48.3    -0.0   32.9   21.4    15.3      96  -3.3
14:10:31  27 51.8   -82 30.3    65.7    55.9   86.2   55.9*   5.2   14.1  1009.9   45.6    46.9     3.0    0.0   22.2    14.9      98  -1.4
14:10:31  27 51.9   -82 30.3    65.3    56.3   86.2                                 0.1    51.5   -12.3    0.2   29.1    -0.0     105  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:11:00  27 52.4   -82 28.7    97.4    25.4  100.7   81.1    6.7   -0.2   994.6   63.5    66.6    -0.0   33.1   24.4    16.3     208  -2.1
14:11:01  27 52.4   -82 28.7    97.4    25.4  100.7   81.1    6.7   -0.3   997.7   63.5    65.1     6.2    0.0   25.4    16.0     206  -1.9
14:11:01  27 52.4   -82 28.8    97.4    25.4  100.7                                 0.1    70.7    -6.4    0.2   29.1    -0.0     209  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:11:30  27 52.8   -82 26.9   100.2    28.5  104.2   80.6    5.5    0.4   972.5   63.8    66.8    -0.0   33.1   23.7    15.5     405  -2.3
14:11:31  27 52.8   -82 26.9   100.2    28.5  104.2   80.6    5.5    0.3   975.4   63.8    64.8     1.8    0.0   24.6    15.4     401  -3.8
14:11:31  27 52.9   -82 27.0   100.2    28.5  104.1                                 0.1    70.6   -11.2    0.2   28.9    -0.0     405  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 4

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:12:00  27 53.3   -82 25.1    97.0    47.4  107.9   68.3    7.1  -15.7   953.6   63.2    65.7    -0.0   21.4   22.7    15.6     578  -3.7
14:12:01  27 53.3   -82 25.1    97.0    47.4  107.9   68.3*   7.1  -15.8   956.2   63.2    64.2     0.3    0.0   23.4    15.0     572  -3.1
14:12:01  27 53.4   -82 25.1    97.1    46.8  107.8                                 0.1    69.7    -8.6    0.2   18.9    -0.0     574  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:12:30  27 54.7   -82 23.8    51.7   101.3  113.7   29.0    7.3   -1.7   923.4   65.5    68.5    -0.1   21.6   22.9     1.8     843  -3.2
14:12:31  27 54.7   -82 23.8    51.7   101.3  113.7   29.0*   7.3   -1.9   926.5   65.5    65.4     2.2    0.0   23.4     2.1     839  -3.8
14:12:31  27 54.7   -82 23.8    51.6   101.4  113.8                                 0.1    72.2   -18.8    0.2   19.2    -0.0     845  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:13:00  27 56.3   -82 23.0    10.8   109.4  109.9    4.9    8.3  -20.1   890.6   59.4    61.9    -0.1   21.5   22.8   -10.6    1159  -2.6
14:13:01  27 56.3   -82 23.0    10.8   109.4  109.9    4.9*   8.3  -20.2   893.0   59.5    59.9     4.1    0.0   23.4    -9.9    1150  -3.8
14:13:01  27 56.4   -82 23.0    11.4   109.4  110.0                                 0.1    65.6   -11.5    0.2   18.6    -0.0    1159  -3.6
00000000   0  0.0     0  0.0                                                                                                        0

14:13:30  27 58.2   -82 23.1    -4.9   116.3  116.4  357.7    6.8   -0.1   870.6   65.8    68.9    -0.1   21.8   22.8   -10.6    1336  -3.3
14:13:31  27 58.2   -82 23.1    -4.8   116.3  116.4  357.8    6.8   -0.2   873.7   65.8    66.0     0.5    0.0   23.4    -9.5    1327  -3.8
14:13:31  27 58.2   -82 23.1    -5.0   116.4  116.5                                 0.1    72.1   -12.2    0.2   18.8    -0.0    1344  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:14:00  28  0.0   -82 23.1    -2.6   107.8  107.8  359.2    7.1    0.5   836.1   60.0    62.9    -0.1   22.0   19.9     1.9    1666  -3.7
14:14:01  28  0.0   -82 23.1    -2.6   107.8  107.8  359.2    7.1    0.4   838.9   60.0    60.1     2.8    0.0   20.3     2.7    1656  -3.8
14:14:01  28  0.1   -82 23.1    -2.7   107.9  107.9                                 0.1    65.9   -12.5    0.2   17.0    -0.0    1687  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:14:30  28  1.8   -82 23.2    -3.5   110.4  110.5  358.2    5.4   -0.9   813.9   61.9    64.8     0.1   21.7   18.2     1.6    1901  -3.5
14:14:31  28  1.8   -82 23.2    -3.4   110.4  110.5  358.3    5.3   -0.9   816.7   61.9    61.8     1.0    0.0   18.5     2.0    1890  -3.8
14:14:31  28  1.8   -82 23.2    -3.6   110.4  110.5                                 0.1    67.7   -13.0    0.2   15.5    -0.0    1910  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:15:00  28  3.5   -82 23.4   -40.9    98.7  106.8  336.6    8.7  -16.1   788.5   60.8    63.4     0.1   21.6   15.9     3.4    2172  -3.5
14:15:01  28  3.5   -82 23.4   -40.8    98.7  106.8  336.6*   8.7  -16.2   791.1   60.8    60.7     3.7    0.0   16.2     3.3    2165  -3.7
14:15:01  28  3.6   -82 23.5   -40.5    99.0  107.0                                 0.1    66.8   -14.9    0.2   13.5    -0.0    2179  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:15:30  28  5.0   -82 24.5   -58.3    89.6  106.9  326.1    4.7    0.9   765.3   62.8    65.6     0.1   20.9   15.1     1.9    2414  -3.7
14:15:31  28  5.0   -82 24.5   -58.2    89.6  106.9  326.2    4.7    0.7   768.1   62.8    62.6     0.9    0.0   15.4     1.8    2410  -3.6
14:15:31  28  5.1   -82 24.5   -58.4    89.6  107.0                                 0.1    68.4   -11.7    0.2   13.1    -0.0    2423  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:16:00  28  6.5   -82 25.5   -58.5    91.2  108.3  325.3    6.2    0.5   745.8   61.7    64.5     0.1   20.5   14.0    -0.2    2633  -3.1
14:16:01  28  6.5   -82 25.5   -58.4    91.2  108.3  325.3    6.2    0.4   748.7   61.7    61.5     3.3   -9.8   14.2    -0.1    2619  -0.4
14:16:01  28  6.5   -82 25.5   -58.6    91.2  108.4                                62.0    67.4   -12.2   -2.3   12.2    -0.0    2631  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:16:30  28  8.0   -82 26.6   -59.3    93.8  111.0  325.3    5.3   -0.5   728.0   61.2    64.2     0.1   20.2   12.6    -5.0    2821  -3.7
14:16:31  28  8.0   -82 26.6   -59.2    93.8  110.9  325.4    5.3   -0.5   730.8   61.2    60.9     3.6   -9.6   12.8    -4.6    2807  -1.3
14:16:31  28  8.0   -82 26.6   -59.4    93.8  111.1                                61.6    66.9   -13.3   -2.7   11.1    -0.0    2833  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 5

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:17:00  28  9.5   -82 27.7   -59.6    99.9  116.3  325.8    4.4    1.2   714.0   64.3    67.3     0.1   20.1   12.1   -12.9    2968  -3.3
14:17:01  28  9.5   -82 27.7   -59.6    99.8  116.3  325.8    4.3    1.0   716.9   64.3    63.8     1.6  -10.9   12.2   -12.0    2960  -2.9
14:17:01  28  9.6   -82 27.7   -59.8    99.8  116.4                                64.7    69.9   -12.5   -2.3   10.5    -0.0    2992  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:17:30  28 11.2   -82 28.8   -59.4   103.0  118.9  326.4    4.6   -1.8   699.0   64.0    67.2     0.1   19.7   10.9   -14.8    3143  -3.7
14:17:31  28 11.2   -82 28.8   -59.3   102.9  118.8  326.4    4.6   -2.0   702.3   64.0    63.7     1.0  -11.2   11.0   -13.6    3130  -2.0
14:17:31  28 11.2   -82 28.8   -59.5   102.9  118.9                                64.3    69.8   -14.8   -3.3    9.3    -0.0    3164  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:18:00  28 12.9   -82 29.9   -59.0   102.7  118.5  327.3    6.7   -1.2   682.0   63.4    66.9     0.1   20.1    9.2   -14.9    3349  -3.7
14:18:01  28 12.9   -82 29.9   -58.9   102.7  118.4  327.4    6.7   -1.4   685.3   63.5    63.0     2.4  -10.5    9.3   -13.8    3333  -3.4
14:18:01  28 12.9   -82 29.9   -59.1   102.8  118.6                                63.7    69.3   -18.7   -4.7    8.2    -0.0    3360  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:18:30  28 14.5   -82 31.0   -58.0   101.1  116.6  327.9    4.9   -0.2   663.1   61.1    64.2     0.1   19.6    7.0    -6.9    3573  -3.1
14:18:31  28 14.5   -82 31.0   -58.0   101.0  116.5  327.9    4.8   -0.3   666.3   61.2    60.7     4.5   -9.1    6.9    -6.7    3558  -2.9
14:18:31  28 14.5   -82 31.0   -58.2   101.0  116.6                                61.4    66.8   -17.2   -4.2    6.9    -0.0    3587  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:19:00  28 16.1   -82 32.1   -61.8   100.4  117.9  326.1    6.5   -0.2   649.8   64.2    67.3     0.1   18.9    6.8   -10.5    3734  -2.6
14:19:01  28 16.1   -82 32.1   -61.7   100.3  117.8  326.1*   6.4   -0.4   653.2   64.2    63.9     3.2  -10.1    6.8   -10.4    3724  -2.2
14:19:01  28 16.2   -82 32.1   -62.0   100.4  118.0                                64.5    69.9   -14.0   -3.0    6.3    -0.0    3747  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:19:30  28 17.7   -82 33.2   -55.9    97.2  112.1  328.1    4.8    1.7   629.1   57.8    60.8     0.1   18.7    5.0    -6.7    3995  -2.7
14:19:31  28 17.7   -82 33.2   -55.8    97.1  112.0  328.1    4.8    1.5   632.1   57.8    57.4     6.1   -7.8    4.7    -6.8    3982  -0.4
14:19:31  28 17.7   -82 33.2   -56.1    97.1  112.1                                58.1    63.2   -15.7   -3.7    5.1    -0.0    4009  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:20:00  28 19.3   -82 34.2   -66.7    90.5  112.5  321.4    6.2   -1.3   617.1   61.2    64.3     0.1   18.9    6.1   -12.8    4154  -2.7
14:20:01  28 19.3   -82 34.2   -66.7    90.5  112.4  321.4    6.2   -1.5   620.2   61.2    61.0     3.5   -9.3    5.9   -13.0    4134  -2.1
14:20:01  28 19.3   -82 34.2   -67.0    90.4  112.6                                61.5    66.5   -10.8   -2.1    5.3    -0.0    4160  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:20:30  28 20.7   -82 35.5   -67.7    90.2  112.8  321.8    4.6   -0.1   603.9   59.6    62.3     0.1   19.0    3.8   -11.4    4328  -3.0
14:20:31  28 20.7   -82 35.5   -67.6    90.1  112.7  321.8    4.6   -0.2   606.9   59.6    59.1     4.2   -8.8    3.5   -11.9    4307  -2.2
14:20:31  28 20.8   -82 35.5   -67.8    90.2  112.8                                59.9    64.7   -13.4   -2.9    4.2    -0.0    4335  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:21:00  28 22.2   -82 36.7   -71.9    93.8  118.2  320.6    1.9    0.6   596.9   64.9    68.0     0.1   18.9    3.9   -13.2    4417  -3.7
14:21:01  28 22.2   -82 36.7   -71.9    93.7  118.1  320.6    1.8    0.4   600.1   64.9    64.1    -2.9  -12.9    3.7   -13.1    4403  -2.2
14:21:01  28 22.3   -82 36.8   -72.1    93.7  118.2                                65.1    69.9   -14.7   -3.2    3.7    -0.0    4425  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:21:30  28 23.8   -82 38.1   -74.0   101.9  125.9  321.6    1.5    1.0   597.0   72.5    75.9     0.1   18.8    4.5   -13.6    4415  -3.7
14:21:31  28 23.8   -82 38.1   -73.9   101.7  125.7  321.7    1.5    0.8   600.5   72.5    72.1    -4.9  -14.9    4.3   -13.7    4401  -1.3
14:21:31  28 23.8   -82 38.1   -74.1   101.8  125.9                                72.9    77.8    -5.8    0.2    3.6    -0.0    4416  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 6

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:22:00  28 25.5   -82 39.4   -72.2   104.3  126.9  323.4    2.4   -1.2   598.3   73.4    76.9     0.1   18.5    5.0   -12.9    4403  -3.7
14:22:01  28 25.5   -82 39.4   -72.2   104.2  126.7  323.5    2.4   -1.3   601.8   73.4    72.1    -1.4  -13.6    4.9   -12.9    4384  -1.3
14:22:01  28 25.5   -82 39.5   -72.3   104.3  126.9                                73.7    78.7   -15.7   -3.4    3.7    -0.0    4399  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:22:30  28 27.1   -82 40.8   -77.9    95.8  123.5  319.5    2.0   -1.9   597.7   71.1    74.5     0.1   18.8    4.6   -12.4    4410  -2.8
14:22:31  28 27.1   -82 40.8   -77.9    95.6  123.3  319.5    2.0   -2.1   601.0   71.1    70.1    -5.4  -14.9    4.4   -12.6    4395  -1.9
14:22:31  28 27.1   -82 40.9   -78.1    95.7  123.5                                71.4    76.2   -14.2   -2.9    3.2    -0.0    4412  -3.7
00000000   0  0.0     0  0.0                                                                                                        0

14:23:00  28 28.6   -82 42.3   -75.5    96.2  122.3  320.4    1.7   -0.8   598.4   69.9    73.3     0.1   18.6    4.5   -11.7    4404   0.0
14:23:01  28 28.6   -82 42.3   -75.4    96.1  122.2  320.4    1.7   -0.9   601.7   69.9    68.7    -2.0  -13.3    4.3   -11.9    4390   0.0
14:23:01  28 28.7   -82 42.3   -75.7    96.2  122.4                                70.1    75.0   -16.0   -3.5    3.3    -0.0    4400   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:23:30  28 30.2   -82 43.7   -72.7    96.8  121.0  321.1    2.0    0.7   598.6   68.0    71.3     0.1   19.0    4.2   -11.1    4405   0.0
14:23:31  28 30.1   -82 43.7   -72.6    96.6  120.9  321.2    2.0    0.5   601.9   68.1    67.2    -0.9  -12.5    4.0   -11.2    4388   0.0
14:23:31  28 30.2   -82 43.7   -72.9    96.6  121.1                                68.4    73.1   -12.6   -2.4    3.5    -0.0    4395   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:24:00  28 31.8   -82 45.0   -71.6    98.0  121.4  322.0    2.1   -0.2   598.8   67.0    70.3     0.1   19.2    3.8   -15.0    4404   0.0
14:24:01  28 31.7   -82 45.0   -71.5    97.9  121.2  322.1    2.1   -0.4   601.9   67.1    66.3     0.4  -11.7    3.6   -15.1    4390   0.0
14:24:01  28 31.8   -82 45.0   -71.8    97.9  121.4                                67.4    72.2   -11.7   -2.0    3.1    -0.0    4397   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:24:30  28 33.3   -82 46.3   -72.6    98.9  122.7  322.3    2.0   -0.5   598.7   67.6    71.0     0.1   18.9    3.7   -17.2    4404   0.0
14:24:31  28 33.3   -82 46.3   -72.6    98.7  122.5  322.4    2.0   -0.6   601.9   67.7    66.9    -0.5  -12.2    3.5   -17.1    4390   0.0
14:24:31  28 33.4   -82 46.3   -72.8    98.7  122.7                                68.0    72.8   -11.1   -1.8    3.0    -0.0    4397   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:25:00  28 35.0   -82 47.6   -73.3    99.9  123.9  322.0    2.0   -0.2   598.6   69.5    73.0     0.1   19.0    4.0   -12.7    4406   0.0
14:25:01  28 34.9   -82 47.6   -73.2    99.7  123.7  322.1    1.9   -0.4   601.9   69.6    68.7    -2.2  -13.3    3.8   -12.9    4391   0.0
14:25:01  28 35.0   -82 47.7   -73.5    99.8  123.9                                69.9    74.8   -13.3   -2.6    3.3    -0.0    4398   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:25:30  28 36.6   -82 49.0   -74.9   100.1  125.1  321.2    1.8   -1.1   598.4   70.7    74.2     0.1   18.8    4.3   -11.2    4406   0.0
14:25:31  28 36.6   -82 49.0   -74.9    99.9  124.9  321.2    1.7   -1.2   601.8   70.7    70.0    -3.8  -14.2    4.1   -10.7    4392   0.0
14:25:31  28 36.6   -82 49.0   -75.2   100.0  125.1                                71.0    75.9   -11.4   -1.9    3.1    -0.0    4398   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:26:00  28 38.2   -82 50.4   -77.3   100.1  126.5  320.4    1.6   -0.6   598.5   71.7    75.1     0.1   18.7    4.3   -10.9    4406   0.0
14:26:01  28 38.2   -82 50.4   -77.3    99.9  126.2  320.4    1.7   -0.7   601.9   71.7    70.8    -4.7  -14.7    4.1   -11.0    4392   0.0
14:26:01  28 38.2   -82 50.5   -77.5    99.9  126.5                                72.0    76.9   -12.7   -2.3    3.0    -0.0    4394   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:26:30  28 39.8   -82 51.8   -76.7    99.5  125.6  320.2    1.9   -0.1   596.3   70.8    74.1     0.1   18.5    3.8   -10.3    4434   0.0
14:26:31  28 39.8   -82 51.8   -76.7    99.3  125.4  320.2    1.9   -0.2   599.6   70.8    70.0    -2.8  -13.7    3.6   -10.2    4421   0.0
14:26:31  28 39.8   -82 51.9   -77.0    99.3  125.7                                71.2    76.0   -12.2   -2.1    2.8    -0.0    4423   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 7

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:27:00  28 41.4   -82 53.2   -76.3    99.0  125.0  320.3    2.0   -0.3   595.1   69.9    73.4     0.1   18.5    3.5   -10.3    4450   0.0
14:27:01  28 41.4   -82 53.2   -76.2    98.8  124.8  320.3    1.9   -0.4   598.4   69.9    69.2    -3.9  -14.0    3.3   -10.7    4438   0.0
14:27:01  28 41.4   -82 53.3   -76.5    98.8  125.0                                70.2    75.1   -11.6   -1.9    2.6    -0.0    4440   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:27:30  28 43.1   -82 54.6   -76.7    99.7  125.8  320.3    2.0   -0.4   595.4   71.8    75.4     0.1   18.3    3.6    -9.5    4445   0.0
14:27:31  28 43.0   -82 54.6   -76.7    99.5  125.6  320.3    1.9   -0.6   598.8   71.8    70.9    -4.6  -14.6    3.4    -9.5    4431   0.0
14:27:31  28 43.1   -82 54.7   -76.9    99.6  125.8                                72.1    77.0   -12.5   -2.2    2.7    -0.0    4433   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:28:00  28 44.7   -82 56.0   -76.9    99.9  126.1  320.3    1.5   -0.4   595.2   73.7    77.2     0.1   18.2    4.0    -8.9    4446   0.0
14:28:01  28 44.6   -82 56.0   -76.9    99.6  125.9  320.3    1.5   -0.5   598.7   73.7    72.8    -6.1  -15.6    3.8    -9.2    4435   0.0
14:28:01  28 44.7   -82 56.1   -77.2    99.7  126.1                                74.0    78.9   -12.0   -2.0    2.4    -0.0    4435   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:28:30  28 46.3   -82 57.5   -77.4   100.1  126.6  320.3    1.5   -0.6   595.3   74.3    77.9     0.1   18.1    4.1    -8.5    4446   0.0
14:28:31  28 46.2   -82 57.5   -77.4    99.9  126.3  320.4    1.5   -0.7   598.7   74.3    73.3    -6.8  -16.1    3.8    -8.8    4433   0.0
14:28:31  28 46.3   -82 57.5   -77.6   100.0  126.6                                74.5    79.5   -12.5   -2.2    2.6    -0.0    4435   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:29:00  28 47.9   -82 58.9   -77.2    98.8  125.4  320.3    1.8   -0.5   595.5   72.3    75.8     0.1   18.1    3.6    -8.2    4443   0.0
14:29:01  28 47.8   -82 58.9   -77.2    98.6  125.2  320.3    1.7   -0.6   598.9   72.4    71.5    -4.6  -14.8    3.4    -8.5    4428   0.0
14:29:01  28 47.9   -82 59.0   -77.4    98.7  125.4                                72.7    77.5   -11.9   -2.0    2.3    -0.0    4434   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:29:30  28 49.5   -83  0.3   -76.2    97.8  124.0  320.0    1.8   -0.2   595.6   70.8    74.2     0.1   17.8    3.4    -8.4    4442   0.0
14:29:31  28 49.4   -83  0.3   -76.2    97.5  123.7  320.0    1.8   -0.3   598.8   70.8    69.8    -3.3  -13.9    3.2    -8.6    4428   0.0
14:29:31  28 49.5   -83  0.4   -76.5    97.6  124.0                                71.1    76.0   -13.0   -2.4    2.5    -0.0    4438   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:30:00  28 51.1   -83  1.7   -74.8    97.8  123.2  320.0    1.8    0.0   595.6   69.5    72.9     0.1   17.8    3.1    -8.1    4442   0.0
14:30:01  28 51.0   -83  1.7   -74.8    97.5  122.9  320.0    1.8   -0.1   598.8   69.5    68.7    -2.8  -13.5    2.8    -8.4    4428   0.0
14:30:01  28 51.1   -83  1.8   -75.1    97.6  123.2                                69.8    74.6   -11.4   -1.8    2.2    -0.0    4438   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:30:30  28 52.7   -83  3.1   -73.4    97.6  122.1  320.0    1.9   -0.2   595.6   69.2    72.7     0.1   17.7    3.2    -7.9    4443   0.0
14:30:31  28 52.6   -83  3.1   -73.4    97.3  121.9  320.0    1.9   -0.3   598.8   69.3    68.5    -3.0  -13.5    3.0    -9.1    4430   0.0
14:30:31  28 52.7   -83  3.1   -73.6    97.4  122.1                                69.6    74.3   -10.7   -1.6    2.2    -0.0    4436   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:31:00  28 54.3   -83  4.4   -72.2    97.1  121.0  320.0    2.0    0.1   595.6   69.2    72.5     0.1   17.7    3.7    -9.1    4441   0.0
14:31:01  28 54.2   -83  4.4   -72.2    96.8  120.8  320.0    1.9   -0.1   598.7   69.2    68.3    -2.3  -13.2    3.5    -8.7    4429   0.0
14:31:01  28 54.2   -83  4.5   -72.5    96.9  121.0                                69.5    74.1   -11.3   -1.8    2.4    -0.0    4435   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:31:30  28 55.8   -83  5.7   -71.3    97.3  120.7  320.0    1.9   -0.1   595.8   66.9    70.1     0.1   17.6    4.0   -10.2    4440   0.0
14:31:31  28 55.8   -83  5.7   -71.3    97.0  120.4  320.0    1.9   -0.3   598.7   66.9    66.0    -0.6  -12.1    3.8   -10.3    4427   0.0
14:31:31  28 55.8   -83  5.8   -71.5    97.1  120.6                                67.2    71.8   -12.0   -2.2    2.6    -0.0    4431   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 8

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:32:00  28 57.4   -83  7.0   -72.5    97.2  121.2  320.2    2.0   -0.1   595.7   67.6    70.9     0.1   17.5    3.0    -7.2    4439   0.0
14:32:01  28 57.3   -83  7.0   -72.5    96.8  121.0  320.3    2.0   -0.3   598.8   67.6    66.8    -0.9  -12.4    2.7    -7.4    4427   0.0
14:32:01  28 57.4   -83  7.1   -72.7    96.9  121.2                                67.9    72.7   -11.8   -2.0    2.2    -0.0    4430   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:32:30  28 59.0   -83  8.4   -73.4    98.2  122.6  320.2    1.9   -0.1   595.6   69.3    72.8     0.1   16.9    3.5    -8.1    4442   0.0
14:32:31  28 58.9   -83  8.4   -73.4    97.9  122.3  320.3    1.9   -0.2   598.7   69.3    68.5    -2.6  -13.4    3.3    -8.5    4429   0.0
14:32:31  28 59.0   -83  8.5   -73.5    98.1  122.6                                69.6    74.4   -11.4   -1.9    2.5    -0.0    4432   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:33:00  29  0.6   -83  9.8   -74.4    99.5  124.3  320.0    1.8   -0.1   595.6   70.5    73.9     0.1    5.7    3.1    -6.9    4440   0.0
14:33:01  29  0.5   -83  9.8   -74.4    99.2  124.0  320.0    1.7   -0.2   598.7   70.5    69.6    -3.0  -13.7    2.9    -7.3    4426   0.0
14:33:01  29  0.6   -83  9.9   -74.6    99.3  124.2                                70.8    75.6   -12.0   -2.1    2.0    -0.0    4431   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:33:30  29  2.2   -83 11.1   -74.1    99.9  124.4  320.2    1.9   -0.2   595.7   70.0    73.4     0.1    4.3    3.8    -9.0    4440   0.0
14:33:31  29  2.1   -83 11.1   -74.1    99.6  124.1  320.2    1.9   -0.4   598.8   70.0    69.3    -3.2  -13.7    3.6    -9.2    4425   0.0
14:33:31  29  2.2   -83 11.2   -74.2    99.7  124.3                                70.3    75.1    -9.9   -1.3    2.4    -0.0    4430   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:34:00  29  3.8   -83 12.5   -72.5    99.0  122.7  320.2    1.8    0.0   595.5   68.8    72.1     0.1   10.8    3.5    -9.7    4443   0.0
14:34:01  29  3.7   -83 12.5   -72.5    98.6  122.4  320.2    1.8   -0.1   598.5   68.8    67.7    -1.6  -12.9    3.3    -9.3    4429   0.0
14:34:01  29  3.8   -83 12.6   -72.7    98.8  122.7                                69.1    73.9   -14.9   -3.3    2.3    -0.0    4431   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:34:30  29  5.4   -83 13.8   -72.0    99.1  122.5  320.1    1.9   -0.4   595.9   68.5    71.8     0.1   15.8    3.1    -7.9    4438   0.0
14:34:31  29  5.3   -83 13.8   -72.0    98.8  122.2  320.1    1.9   -0.5   598.8   68.5    67.6    -1.5  -12.8    2.8    -7.4    4424   0.0
14:34:31  29  5.4   -83 13.9   -72.1    98.9  122.4                                68.8    73.5   -11.5   -2.0    2.1    -0.0    4429   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:35:00  29  7.1   -83 15.2   -71.9    98.4  121.9  320.5    2.1   -0.6   595.9   66.7    69.8     0.3    2.6    2.4    -5.4    4438   0.0
14:35:01  29  6.9   -83 15.2   -71.9    98.0  121.6  320.6    2.1   -0.7   598.8   66.8    66.3     1.9  -10.9    2.2    -6.5    4424   0.0
14:35:01  29  7.0   -83 15.3   -72.0    98.3  121.8                                67.1    72.1   -10.9   -1.6    2.0    -0.0    4426   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:35:30  29  8.6   -83 16.5   -72.9    98.1  122.2  320.2    2.0   -0.2   595.9   67.6    70.9     0.2   12.7    2.5    -5.7    4437   0.0
14:35:31  29  8.5   -83 16.5   -72.9    97.8  121.9  320.2    2.0   -0.3   598.8   67.6    66.9    -2.4  -13.0    2.3    -5.9    4423   0.0
14:35:31  29  8.6   -83 16.6   -73.1    97.9  122.2                                67.9    72.7   -13.1   -2.5    1.7    -0.0    4427   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:36:00  29 10.2   -83 17.8   -71.7    98.7  122.0  320.1    1.9   -0.2   595.7   68.1    71.5     0.1    6.1    2.6    -6.2    4439   0.0
14:36:01  29 10.1   -83 17.8   -71.7    98.4  121.7  320.1    1.9   -0.4   598.7   68.1    67.2    -1.5  -12.7    2.3    -6.8    4424   0.0
14:36:01  29 10.2   -83 17.9   -71.8    98.5  121.9                                68.4    73.0   -12.1   -2.1    1.7    -0.0    4428   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:36:30  29 11.9   -83 19.2   -72.1    99.5  122.9  320.0    1.6   -0.1   595.5   71.3    74.6     0.1    4.6    3.8    -7.4    4440   0.0
14:36:31  29 11.7   -83 19.2   -72.2    99.1  122.6  320.1    1.6   -0.2   598.5   71.3    70.5    -5.0  -14.8    3.6    -7.6    4425   0.0
14:36:31  29 11.8   -83 19.3   -72.2    99.3  122.8                                71.6    76.3   -11.3   -1.8    2.2    -0.0    4429   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 9

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:37:00  29 13.5   -83 20.5   -71.8    99.6  122.8  320.1    2.1   -0.0   595.7   70.6    73.9     0.1    4.4    3.3    -6.6    4435   0.0
14:37:01  29 13.3   -83 20.5   -71.9    99.2  122.5  320.1    2.0   -0.1   598.8   70.7    69.7    -2.9  -13.7    3.0    -6.7    4421   0.0
14:37:01  29 13.4   -83 20.6   -71.9    99.4  122.7                                70.9    75.7   -12.8   -2.3    2.0    -0.0    4427   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:37:30  29 15.1   -83 21.8   -70.5    99.5  122.0  320.3    2.0   -0.1   595.9   69.1    72.5     0.2    3.1    3.0    -5.6    4435   0.0
14:37:31  29 14.9   -83 21.8   -70.5    99.1  121.7  320.3    1.9   -0.3   598.8   69.1    68.3    -2.2  -13.1    2.8    -6.0    4421   0.0
14:37:31  29 15.0   -83 21.9   -70.6    99.3  121.9                                69.4    74.2   -13.3   -2.7    2.1    -0.0    4426   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:38:00  29 16.7   -83 23.1   -70.4    99.5  121.9  320.2    1.7   -0.3   595.7   68.6    71.9     0.2    3.4    3.1    -5.2    4437   0.0
14:38:01  29 16.5   -83 23.1   -70.5    99.1  121.6  320.2    1.7   -0.5   598.6   68.7    68.1    -2.4  -13.3    2.9    -5.7    4424   0.0
14:38:01  29 16.6   -83 23.2   -70.5    99.3  121.8                                69.0    73.9   -11.9   -2.0    1.9    -0.0    4422   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:38:30  29 18.3   -83 24.4   -70.0    99.6  121.8  320.2    2.1   -0.4   596.0   68.4    71.8     0.2    4.2    3.1    -5.2    4434   0.0
14:38:31  29 18.2   -83 24.4   -70.0    99.3  121.5  320.2    2.0   -0.5   598.9   68.4    67.7    -2.1  -12.6    2.9    -5.8    4419   0.0
14:38:31  29 18.2   -83 24.5   -70.1    99.5  121.7                                68.7    73.6   -13.3   -2.6    2.3    -0.0    4418   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:39:00  29 19.9   -83 25.7   -69.7    98.9  120.9  320.3    2.0   -0.4   595.9   68.2    71.5     0.3    2.9    3.1    -4.9    4434   0.0
14:39:01  29 19.8   -83 25.7   -69.7    98.5  120.7  320.4    2.0   -0.5   598.7   68.2    67.8    -1.8  -12.6    2.9    -5.7    4419   0.0
14:39:01  29 19.8   -83 25.8   -69.8    98.7  120.9                                68.6    73.5   -10.9   -1.9    2.1    -0.0    4419   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:39:30  29 21.5   -83 27.0   -70.4    98.4  121.0  319.7    2.1    0.0   596.0   67.0    70.2     0.2    1.8    2.8    -5.1    4434   0.0
14:39:31  29 21.3   -83 27.0   -70.4    98.0  120.7  319.7    2.0   -0.2   598.7   67.0    66.5    -1.0  -11.6    2.6    -5.7    4419   0.0
14:39:31  29 21.4   -83 27.1   -70.5    98.2  120.9                                67.3    72.2   -10.7   -1.7    2.0    -0.0    4419   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:40:00  29 23.1   -83 28.3   -72.1    98.1  121.8  319.9    1.7   -1.1   595.7   69.4    72.8     0.2    1.8    3.3    -5.2    4435   0.0
14:40:01  29 22.9   -83 28.3   -72.2    97.8  121.5  319.9    1.7   -1.3   598.7   69.4    68.5    -3.4  -12.7    3.1    -5.8    4420   0.0
14:40:01  29 23.0   -83 28.4   -72.1    98.0  121.7                                69.6    74.5   -13.7   -2.6    2.0    -0.0    4421   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:40:30  29 24.7   -83 29.7   -71.0    99.3  122.1  319.0    2.3    0.4   596.0   71.0    74.5     0.2    1.8    2.9    -6.6    4429   0.0
14:40:31  29 24.5   -83 29.7   -71.1    99.0  121.9  319.1    2.3    0.3   599.1   71.0    70.3    -5.7  -13.9    2.7    -7.2    4413   0.0
14:40:31  29 24.6   -83 29.8   -71.1    99.2  122.0                                71.3    76.3   -10.5   -1.6    1.7    -0.0    4420   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:41:00  29 26.3   -83 31.0   -75.9    94.7  121.4  313.8    2.5   -0.5   596.1   67.2    70.3     0.2    1.5    2.1    -8.1    4429   0.0
14:41:01  29 26.1   -83 31.0   -76.0    94.3  121.1  313.8    2.5   -0.7   599.0   67.2    66.5    -2.7  -12.1    1.9    -7.8    4412   0.0
14:41:01  29 26.2   -83 31.1   -76.0    94.5  121.3                                67.5    72.3   -10.7   -1.2    1.1    -0.0    4420   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:41:30  29 27.9   -83 32.4   -74.5    99.8  124.5  316.2    2.0   -0.1   595.5   70.1    73.4     0.2    1.1    2.8    -6.3    4435   0.0
14:41:31  29 27.7   -83 32.4   -74.6    99.4  124.3  316.3*   1.9   -0.3   598.5   70.1    68.8    -4.4  -17.2    2.6    -6.5    4418   0.0
14:41:31  29 27.8   -83 32.5   -74.6    99.6  124.4                                70.3    75.2   -19.4   -4.5    1.4    -0.0    4430   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 10

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:42:00  29 29.5   -83 33.8   -77.6   101.2  127.5  316.9    1.3   -0.6   595.3   74.2    77.8     0.3    1.5    3.3    -5.0    4437   0.0
14:42:01  29 29.3   -83 33.8   -77.7   100.8  127.3  317.0    1.3   -0.7   598.5   74.2    73.1    -7.7  -18.4    3.2    -5.8    4422   0.0
14:42:01  29 29.4   -83 33.9   -77.6   101.0  127.4                                73.3    79.2   -16.0   -5.0    1.7    -0.0    4431   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:42:30  29 31.5   -83 34.6    12.7   141.6  142.2    2.4   -2.1   20.1   598.2   79.4    83.7     0.3    1.6    4.1    -4.4    4393   0.0
14:42:31  29 31.3   -83 34.6    12.6   141.3  141.8    2.5*  -2.1   20.0   601.8   79.4    78.1     3.5  -21.7    0.4    -6.1    4373   0.0
14:42:31  29 31.4   -83 34.7    11.0   141.4  141.8                                69.9    84.6   -16.2   -3.2    2.2    -0.0    4387   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:43:00  29 33.4   -83 33.2   136.6    57.4  148.2   68.7   -3.3   33.7   615.4   81.1    85.5     0.3    2.8    5.4    -3.2    4171   0.0
14:43:01  29 33.2   -83 33.2   136.5    57.1  147.9   68.7*  -3.4   33.5   619.2   81.1    79.7    -0.1  -21.0    0.0    -4.4    4148   0.0
14:43:01  29 33.3   -83 33.3   136.2    58.5  148.2                                70.1    86.3   -15.0   34.1    3.1    -0.0    4163   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:43:30  29 32.8   -83 30.7   112.0   -87.4  142.0  132.7    1.3    4.3   620.9   75.2    79.0     0.3    3.1    5.3    -2.9    4107   0.0
14:43:31  29 32.6   -83 30.7   111.8   -87.7  142.1  132.7    1.3    4.2   624.3   75.2    74.3    -7.0  -18.5    1.9    -3.9    4088   0.0
14:43:31  29 32.7   -83 30.8   112.1   -87.6  142.3                                77.5    80.4   -16.5   36.6    3.2    -0.0    4102   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:44:00  29 31.6   -83 28.5   119.6   -65.2  136.2  123.4    0.9   18.5   620.5   66.4    70.0     0.3    3.0    4.1    -4.2    4109   0.0
14:44:01  29 31.4   -83 28.5   119.5   -65.5  136.3  123.5*   0.9   18.3   623.6   66.4    67.0     0.2  -11.2    3.1    -4.9    4089   0.0
14:44:01  29 31.5   -83 28.6   120.0   -64.8  136.4                                59.2    71.4     6.5   37.0    3.2    -0.0    4110   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:44:30  29 30.0   -83 26.9    74.2  -109.0  131.8  152.2    4.0    8.3   623.9   67.1    71.0     0.2    3.6    4.6    -4.7    4064   0.0
14:44:31  29 29.8   -83 26.9    74.1  -109.3  132.0  152.3*   4.0    8.1   627.1   67.1    67.9    -1.0  -11.0    4.0    -5.3    4043   0.0
14:44:31  29 29.9   -83 27.0    74.5  -109.2  132.2                                48.7    72.4     9.1   37.2    3.1    -0.0    4060   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:45:00  29 28.3   -83 25.6    73.3  -104.9  128.0  154.5    2.5   18.1   619.7   64.2    67.1     0.2    3.3    3.8    -4.8    4120   0.0
14:45:01  29 28.0   -83 25.6    73.2  -105.3  128.2  154.5*   2.5   18.0   622.8   64.2    63.7     7.4   -9.4    3.3    -5.3    4094   0.0
14:45:01  29 28.1   -83 25.7    74.5  -104.6  128.4                                37.1    69.3    -9.4   34.9    2.9    -0.0    4116   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:45:30  29 26.5   -83 24.4    66.7  -109.0  127.9  156.2    2.3   -3.1   621.1   62.5    65.9     0.2    3.8    3.9    -4.8    4113   0.0
14:45:31  29 26.2   -83 24.4    66.6  -109.4  128.1  156.2    2.3   -3.2   623.6   62.6    62.1     2.0   -9.5    3.5    -4.1    4091   0.0
14:45:31  29 26.3   -83 24.6    66.7  -109.3  128.0                                22.1    67.5    -8.4   23.8    2.8    -0.0    4106   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:46:00  29 24.7   -83 23.2    60.0  -114.4  129.2  158.9    2.4    1.1   620.8   63.5    66.7     0.2    3.9    4.1    -4.2    4118   0.0
14:46:01  29 24.4   -83 23.2    59.9  -114.8  129.4  158.9    2.3    1.0   623.4   63.5    63.0     1.5   -8.0    3.8    -5.5    4098   0.0
14:46:01  29 24.5   -83 23.4    60.0  -114.5  129.3                                29.1    68.4    -9.6   22.4    3.3    -0.0    4107   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:46:30  29 22.8   -83 22.1    58.7  -120.3  133.8  160.0    1.9    0.0   620.6   69.9    73.1     0.2    3.8    4.7    -3.4    4124   0.0
14:46:31  29 22.5   -83 22.1    58.5  -120.7  134.1  160.0    1.9   -0.1   623.5   69.9    69.1    -4.0  -12.0    4.5    -4.0    4100   0.0
14:46:31  29 22.6   -83 22.3    58.7  -120.5  134.0                                28.9    74.9   -12.8   18.7    3.2    -0.0    4110   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 11

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:47:00  29 20.8   -83 21.0    65.4  -118.7  135.5  157.2    1.7   -0.9   620.5   70.2    73.7     0.2   11.6    5.1    -4.9    4119   0.0
14:47:01  29 20.5   -83 21.0    65.3  -119.1  135.8  157.2    1.7   -1.0   623.4   70.2    69.5    -3.9  -13.2    4.9    -5.7    4099   0.0
14:47:01  29 20.7   -83 21.1    65.4  -118.9  135.7                                29.0    75.2   -10.6    6.9    3.1    -0.0    4111   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:47:30  29 18.9   -83 19.8    66.8  -119.5  136.9  156.7    1.6   -0.3   620.5   71.3    74.8     0.2    5.2    5.2    -4.7    4121   0.0
14:47:31  29 18.6   -83 19.8    66.6  -119.8  137.1  156.7    1.5   -0.4   623.4   71.3    70.4    -5.2  -14.4    4.9    -5.4    4101   0.0
14:47:31  29 18.7   -83 19.9    66.8  -119.6  137.0                                28.9    76.3   -12.9    0.8    2.9    -0.0    4108   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:48:00  29 16.9   -83 18.5    67.0  -120.5  137.9  156.6    1.7   -0.3   620.5   72.1    75.7     0.2    4.6    5.3    -4.6    4120   0.0
14:48:01  29 16.7   -83 18.5    66.8  -120.8  138.1  156.7    1.6   -0.4   623.5   72.1    71.2    -5.7  -14.1    5.1    -5.6    4101   0.0
14:48:01  29 16.8   -83 18.7    67.1  -120.6  138.0                                46.8    77.2   -12.3   -1.3    3.2    -0.0    4106   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:48:30  29 15.0   -83 17.3    66.8  -121.0  138.3  156.5    1.7   -0.2   620.5   72.8    76.4     0.2    3.4    5.3    -4.6    4121   0.0
14:48:31  29 14.7   -83 17.3    66.7  -121.4  138.5  156.6    1.7   -0.4   623.5   72.8    71.8    -6.7  -14.1    5.1    -5.7    4102   0.0
14:48:31  29 14.8   -83 17.4    66.9  -121.2  138.4                                54.9    77.8   -14.1   -2.6    2.8    -0.0    4106   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:49:00  29 13.0   -83 16.1    66.0  -122.1  138.8  156.3    1.6    0.2   620.4   74.1    77.8     0.2    6.1    5.7    -4.9    4122   0.0
14:49:01  29 12.7   -83 16.1    65.8  -122.4  139.0  156.3    1.6    0.1   623.5   74.1    73.1    -7.2  -13.3    5.5    -5.2    4103   0.0
14:49:01  29 12.9   -83 16.2    66.1  -122.2  138.9                                67.6    79.1   -12.9   -2.0    3.4    -0.0    4109   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:49:30  29 11.0   -83 14.8    65.8  -122.6  139.1  156.6    1.4   -0.5   620.4   74.8    78.5     0.2   12.1    5.8    -4.9    4124   0.0
14:49:31  29 10.7   -83 14.8    65.6  -123.0  139.4  156.6    1.4   -0.6   623.5   74.8    74.0    -8.2  -13.2    5.7    -5.7    4104   0.0
14:49:31  29 10.9   -83 15.0    65.8  -122.7  139.3                                67.8    79.9   -11.8   -2.1    3.4    -0.0    4110   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:50:00  29  9.0   -83 13.6    65.3  -123.0  139.3  156.9    1.6   -0.5   620.6   74.1    77.7     0.2   10.8    5.7    -5.2    4124   0.0
14:50:01  29  8.7   -83 13.6    65.1  -123.4  139.5  156.9    1.5   -0.6   623.6   74.1    73.3    -7.9  -15.8    5.5    -5.8    4106   0.0
14:50:01  29  8.9   -83 13.8    65.4  -123.1  139.4                                67.9    79.2   -12.0   -2.0    3.4    -0.0    4109   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:50:30  29  7.0   -83 12.4    65.9  -122.7  139.2  156.6    1.5   -0.4   620.3   73.2    76.8     0.2   16.9    5.4    -4.6    4128   0.0
14:50:31  29  6.7   -83 12.4    65.7  -123.0  139.5  156.6    1.5   -0.5   623.4   73.2    72.3    -6.3  -15.7    5.2    -5.6    4108   0.0
14:50:31  29  6.9   -83 12.6    66.0  -122.7  139.4                                72.9    78.3   -12.6   -3.1    3.1    -0.0    4114   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:51:00  29  5.0   -83 11.2    65.4  -123.4  139.7  156.5    1.5   -0.1   620.2   74.8    78.4     0.2   18.1    5.2    -4.3    4130   0.0
14:51:01  29  4.7   -83 11.2    65.2  -123.7  139.9  156.6    1.5   -0.2   623.4   74.8    73.9    -9.1  -16.9    5.0    -5.4    4112   0.0
14:51:01  29  4.9   -83 11.3    65.5  -123.5  139.8                                72.9    79.9   -13.1   -2.2    2.9    -0.0    4114   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:51:30  29  3.0   -83 10.0    65.5  -123.5  139.8  156.7    1.5   -0.2   620.3   74.9    78.8     0.2   16.6    5.4    -4.6    4128   0.0
14:51:31  29  2.7   -83 10.0    65.3  -123.8  140.0  156.7    1.5   -0.4   623.4   75.0    74.1    -8.7  -16.6    5.2    -5.4    4110   0.0
14:51:31  29  2.9   -83 10.1    65.6  -123.5  139.9                                73.1    80.0   -12.0   -1.7    2.9    -0.0    4111   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 12

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:52:00  29  1.0   -83  8.8    66.0  -123.8  140.2  156.7    1.4   -0.4   620.3   74.7    78.4     0.2   13.4    5.4    -4.8    4127   0.0
14:52:01  29  0.7   -83  8.8    65.8  -124.1  140.5  156.8    1.4   -0.6   623.4   74.7    73.9    -8.2  -16.3    5.3    -5.7    4109   0.0
14:52:01  29  0.9   -83  8.9    66.1  -123.8  140.4                                73.6    79.7   -11.8   -1.8    2.9    -0.0    4112   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:52:30  28 59.0   -83  7.6    66.4  -124.1  140.8  156.6    1.5   -0.2   620.4   74.6    78.3     0.2   11.3    5.8    -5.4    4127   0.0
14:52:31  28 58.7   -83  7.6    66.2  -124.5  141.0  156.6    1.4   -0.4   623.5   74.6    73.7    -8.0  -16.6    5.6    -6.2    4110   0.0
14:52:31  28 58.9   -83  7.7    66.5  -124.2  140.9                                73.8    79.6   -12.3   -2.1    3.2    -0.0    4111   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:53:00  28 57.0   -83  6.3    66.7  -122.8  139.7  155.6    0.0   -3.2   623.3   77.6    81.3     0.2   17.8    6.0    -5.1    4091   0.0
14:53:01  28 56.7   -83  6.3    66.5  -123.1  139.9  155.6    0.1   -3.3   626.4   77.6    76.3    -8.6  -17.4    5.8    -6.0    4072   0.0
14:53:01  28 56.9   -83  6.5    66.7  -122.9  139.9                                76.1    82.4   -13.7   -2.6    3.1    -0.0    4076   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:53:30  28 55.1   -83  5.0    73.5  -111.9  133.9  151.0   -0.2   -2.8   633.0   70.8    73.9     0.2   18.0    6.3    -4.9    3968   0.0
14:53:31  28 54.7   -83  5.0    73.2  -112.2  134.0  151.0   -0.2   -2.9   635.6   70.8    69.4    -2.6  -13.6    6.2    -5.0    3953   0.0
14:53:31  28 55.0   -83  5.2    73.5  -112.0  134.0                                71.1    75.3   -13.2   -2.6    3.7    -0.0    3958   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:54:00  28 53.3   -83  3.8    61.3  -114.6  129.9  155.5   -3.6    2.4   650.3   71.8    75.2     0.2   18.1    7.7    -4.1    3749   0.0
14:54:01  28 52.9   -83  3.8    61.1  -114.9  130.1  155.5*  -3.7    2.3   653.0   71.8    71.0    -2.3  -13.7    7.7    -4.6    3734   0.0
14:54:01  28 53.1   -83  3.9    61.5  -114.5  130.0                                72.2    76.4    -3.9    0.5    5.2    -0.0    3743   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:54:30  28 51.4   -83  2.7    54.1  -118.0  129.8  159.3    0.9    1.0   670.2   70.5    73.9     0.2   18.2    8.9    -2.5    3514   0.0
14:54:31  28 51.0   -83  2.7    53.9  -118.3  130.0  159.3    0.8    0.8   673.0   70.5    70.2    -0.6  -12.9    8.9    -2.8    3496   0.0
14:54:31  28 51.2   -83  2.9    54.2  -118.0  129.9                                70.8    75.7    -5.6   -0.1    5.8    -0.0    3502   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:55:00  28 49.5   -83  1.8    53.8  -108.5  121.1  157.5    2.3   -2.4   671.1   60.6    63.5     0.2   18.3    8.1    -3.3    3507   0.0
14:55:01  28 49.2   -83  1.8    53.6  -108.8  121.3  157.5*   2.3   -2.5   673.4   60.6    60.5     3.5   -9.2    8.1    -3.4    3490   0.0
14:55:01  28 49.4   -83  1.9    53.8  -108.5  121.1                                60.9    65.5    -4.4    0.1    6.0    -0.0    3497   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:55:30  28 47.8   -83  0.7    61.9  -107.1  123.6  153.7    2.3    8.7   671.9   63.4    66.7     0.2   18.3    7.9    -2.5    3495   0.0
14:55:31  28 47.4   -83  0.7    61.6  -107.4  123.8  153.8*   2.2    8.6   674.6   63.4    63.6     1.6  -10.5    7.9    -2.5    3476   0.0
14:55:31  28 47.7   -83  0.8    62.4  -106.9  123.8                                63.8    68.6    -1.5    1.1    5.9    -0.0    3479   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:56:00  28 46.0   -82 59.6    58.7  -113.2  127.5  156.3    1.9    0.3   671.9   67.0    70.3     0.2   18.5    8.8    -3.1    3497   0.0
14:56:01  28 45.6   -82 59.6    58.4  -113.5  127.6  156.3    1.8    0.2   674.5   67.0    66.6    -1.8  -12.8    8.8    -3.2    3479   0.0
14:56:01  28 45.9   -82 59.7    58.8  -113.2  127.6                                67.3    72.1    -9.9   -1.6    6.2    -0.0    3483   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:56:30  28 44.1   -82 58.5    59.9  -117.0  131.5  156.6    1.7    0.0   671.9   70.6    74.1     0.1   18.6    9.8    -3.2    3497   0.0
14:56:31  28 43.7   -82 58.5    59.7  -117.3  131.6  156.6    1.7   -0.2   674.7   70.6    70.2    -5.0  -14.8    9.8    -3.3    3478   0.0
14:56:31  28 44.0   -82 58.6    60.1  -117.0  131.6                                70.9    75.8   -10.1   -1.6    6.7    -0.0    3485   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 13

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

14:57:00  28 42.2   -82 57.4    60.4  -119.8  134.2  156.5    1.4    0.1   671.5   74.4    78.1     0.1   18.8    9.7    -3.9    3499   0.0
14:57:01  28 41.8   -82 57.4    60.1  -120.1  134.3  156.5    1.4   -0.1   674.6   74.5    73.9    -8.2  -16.8    9.6    -3.8    3481   0.0
14:57:01  28 42.1   -82 57.5    60.5  -119.8  134.2                                74.7    79.8   -11.3   -1.9    6.1    -0.0    3487   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:57:30  28 40.2   -82 56.3    60.7  -121.4  135.8  157.0    1.2   -0.3   671.6   75.0    78.8     0.1   18.7    9.5    -3.6    3500   0.0
14:57:31  28 39.9   -82 56.3    60.5  -121.7  135.9  157.0    1.1   -0.4   674.7   75.0    74.4    -9.0  -17.3    9.4    -3.8    3481   0.0
14:57:31  28 40.1   -82 56.4    60.9  -121.5  135.9                                75.3    80.3   -11.4   -1.9    6.0    -0.0    3486   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:58:00  28 38.3   -82 55.2    60.2  -120.2  134.5  156.8    1.5   -0.2   671.8   74.3    78.0     0.1   18.9    9.7    -4.6    3498   0.0
14:58:01  28 37.9   -82 55.2    60.0  -120.5  134.6  156.9    1.5   -0.4   674.8   74.3    73.8    -8.2  -16.8    9.7    -4.8    3479   0.0
14:58:01  28 38.2   -82 55.3    60.4  -120.3  134.6                                74.5    79.6   -10.8   -1.7    6.3    -0.0    3483   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:58:30  28 36.3   -82 54.1    59.3  -118.6  132.6  156.4    1.6    0.1   671.7   73.0    76.6     0.1   19.2    9.6    -5.5    3498   0.0
14:58:31  28 36.0   -82 54.1    59.1  -118.9  132.7  156.5    1.5   -0.0   674.7   73.0    72.6    -7.3  -16.2    9.6    -4.7    3483   0.0
14:58:31  28 36.2   -82 54.1    59.5  -118.6  132.7                                73.3    78.3    -9.8   -1.3    6.5    -0.0    3485   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:59:00  28 34.4   -82 53.0    45.4  -121.3  129.5  163.2    0.5    0.7   672.7   69.3    72.6     0.1   19.1    8.8    -2.0    3489   0.0
14:59:01  28 34.0   -82 53.0    45.1  -121.5  129.6  163.2    0.5    0.6   675.4   69.3    68.4    -2.9  -13.6    8.8    -3.1    3472   0.0
14:59:01  28 34.3   -82 53.1    45.6  -121.3  129.6                                69.6    74.2   -12.3   -2.3    6.3    -0.0    3476   0.0
00000000   0  0.0     0  0.0                                                                                                        0

14:59:30  28 32.5   -82 52.2    40.2  -116.5  123.2  164.7    0.3    1.5   683.6   63.5    66.4     0.1   19.1    9.3    -6.3    3362   0.0
14:59:31  28 32.1   -82 52.2    40.0  -116.7  123.3  164.7    0.3    1.4   686.0   63.5    62.8     4.1   -9.4    9.4    -6.4    3343   0.0
14:59:31  28 32.4   -82 52.3    40.5  -116.5  123.3                                63.9    68.3    -9.5   -1.5    6.8    -0.0    3351   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:00:00  28 30.6   -82 51.6    35.2  -114.0  119.3  167.0   -0.1   -0.9   697.4   60.8    63.5     0.2   19.3    9.2    -1.6    3198   0.0
15:00:01  28 30.2   -82 51.6    35.0  -114.2  119.4  167.1   -0.1   -1.0   699.6   60.8    60.1     7.0   -7.7    9.2    -1.8    3182   0.0
15:00:01  28 30.5   -82 51.7    35.4  -114.0  119.4                                61.1    65.4    -9.2   -1.4    7.0    -0.0    3191   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:00:30  28 28.8   -82 50.8    43.1  -111.3  119.4  163.8   -0.8    0.7   714.9   62.2    65.0     0.1   19.5   10.2     1.0    2996   0.0
15:00:31  28 28.4   -82 50.8    42.8  -111.5  119.5  163.9   -0.8    0.5   717.2   62.2    61.6     6.1   -8.4   10.2     0.7    2983   0.0
15:00:31  28 28.7   -82 50.9    43.4  -111.3  119.5                                62.6    66.9    -9.0   -1.4    7.7    -0.0    2990   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:01:00  28 27.0   -82 50.0    40.9  -115.8  122.8  164.9    1.9    4.8   728.6   66.6    70.0     0.1   19.6   11.8     1.3    2841   0.0
15:01:01  28 26.6   -82 50.0    40.6  -116.0  122.9  164.9    1.9    4.7   731.4   66.6    66.7    -0.1  -12.0   11.9     0.9    2825   0.0
15:01:01  28 26.8   -82 50.1    41.2  -115.7  122.9                                67.0    72.0    -6.3   -0.3    8.6    -0.0    2831   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:01:30  28 25.1   -82 49.3    41.5  -118.0  125.1  164.7    1.8    0.1   728.1   68.9    72.2     0.1   19.7   11.9     2.3    2848   0.0
15:01:31  28 24.7   -82 49.3    41.2  -118.1  125.1  164.7    1.8   -0.0   730.9   68.9    68.8    -3.1  -13.7   12.0     1.8    2830   0.0
15:01:31  28 24.9   -82 49.4    41.6  -118.0  125.1                                69.2    74.3    -8.2   -0.9    8.6    -0.0    2840   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 14

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

15:02:00  28 23.1   -82 48.5    42.1  -119.9  127.1  164.9    1.8    0.0   728.1   71.3    74.7     0.1   19.8   12.4     2.1    2847   0.0
15:02:01  28 22.7   -82 48.5    41.8  -120.1  127.2  164.9    1.7   -0.1   731.0   71.3    71.0    -5.1  -15.1   12.4     1.7    2830   0.0
15:02:01  28 23.0   -82 48.6    42.3  -119.9  127.1                                71.6    76.7    -9.8   -1.4    8.6    -0.0    2840   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:02:30  28 21.2   -82 47.8    37.1  -121.7  127.3  166.7   -0.9    2.3   741.4   72.8    76.2     0.1   19.9   13.5     2.5    2700   0.0
15:02:31  28 20.8   -82 47.8    36.8  -121.9  127.3  166.8   -0.9    2.1   744.3   72.8    72.1    -4.4  -15.0   13.7     2.1    2680   0.0
15:02:31  28 21.0   -82 47.9    37.3  -121.7  127.3                                73.1    78.0   -10.5   -1.6    9.4    -0.0    2693   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:03:00  28 19.2   -82 47.2    29.7  -121.0  124.6  168.7   -1.8    1.2   757.5   71.7    75.2     0.1   20.2   14.4     2.9    2521   0.0
15:03:01  28 18.8   -82 47.2    29.4  -121.1  124.6  168.7*  -1.8    1.1   760.3   71.7    71.3    -3.2  -14.2   14.6     2.7    2502   0.0
15:03:01  28 19.1   -82 47.2    29.9  -120.9  124.6                                72.1    76.9    -5.5   -0.0   10.1    -0.0    2515   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:03:30  28 17.3   -82 46.7    23.2  -115.1  117.4  170.2   -0.6   -1.1   773.0   68.2    71.4     0.1   20.4   14.7     4.0    2351   0.0
15:03:31  28 16.9   -82 46.7    23.0  -115.2  117.5  170.3   -0.6   -1.2   775.5   68.3    67.8     0.6  -12.0   15.0     3.5    2337   0.0
15:03:31  28 17.2   -82 46.8    23.4  -115.2  117.5                                68.7    73.3    -4.0    0.4   10.7    -0.0    2351   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:04:00  28 15.4   -82 46.3    21.8  -112.1  114.2  170.6   -2.3    4.0   791.3   67.2    70.0     0.1   20.1   16.1     4.0    2156   0.0
15:04:01  28 15.0   -82 46.3    21.4  -112.2  114.3  170.7*  -2.4    3.9   793.6   67.2    66.3    -1.2  -12.4   16.4     3.6    2151   0.0
15:04:01  28 15.3   -82 46.3    22.1  -112.1  114.2                                67.6    71.9    -7.4   -0.8   12.1    -0.0    2159   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:04:30  28 13.6   -82 45.9    24.4  -111.4  114.1  168.0    0.1   -0.7   811.0   68.1    71.4     0.1   20.2   18.5    -2.7    1951   0.0
15:04:31  28 13.2   -82 45.9    24.1  -111.5  114.1  168.0*   0.1   -0.9   813.5   68.1    68.5    -1.1  -12.6   18.9    -3.0    1943   0.0
15:04:31  28 13.5   -82 45.9    24.5  -111.5  114.1                                68.6    73.4     4.8    3.2   13.5    -0.0    1954   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:05:00  28 11.8   -82 45.4    23.7  -111.6  114.1  169.3   -1.1   -0.5   830.5   69.6    72.6     0.1   23.2   20.4   -11.1    1751   0.0
15:05:01  28 11.4   -82 45.4    23.4  -111.7  114.1  169.3   -1.1   -0.6   833.0   69.6    69.3    -0.3  -12.5   20.8    -9.9    1741   0.0
15:05:01  28 11.7   -82 45.5    23.8  -111.6  114.1                                70.0    74.9    -3.1    0.8   15.0    -0.0    1754   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:05:30  28 10.0   -82 45.1    17.6  -111.2  112.6  172.3   -1.0    1.0   848.4   70.9    73.9     0.1   21.8   21.3    -9.7    1568   0.0
15:05:31  28  9.6   -82 45.1    17.3  -111.3  112.6  172.3   -1.0    0.9   850.9   71.0    70.7    -3.2  -14.0   21.8    -9.3    1563   0.0
15:05:31  28  9.9   -82 45.1    17.7  -111.2  112.6                                71.4    76.1    -2.0    1.2   15.5    -0.0    1575   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:06:00  28  8.2   -82 44.8    17.0  -108.7  110.0  172.4   -0.5   -2.0   864.6   68.0    71.0     0.1   23.3   22.0   -11.1    1409   0.0
15:06:01  28  7.8   -82 44.8    16.8  -108.7  110.0  172.4   -0.6   -2.2   867.1   68.1    68.1    -1.3  -12.7   22.5   -10.6    1402   0.0
15:06:01  28  8.1   -82 44.8    17.1  -108.7  110.0                                68.5    73.4     0.4    1.7   16.5    -0.0    1418   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:06:30  28  6.4   -82 44.4    26.7  -106.6  109.9  166.7    1.8   -1.6   877.8   68.8    72.0     0.1   23.7   22.6    -8.5    1285   0.0
15:06:31  28  6.0   -82 44.4    26.4  -106.6  109.9  166.7    1.8   -1.7   880.5   68.8    69.5     0.0  -12.3   23.1   -10.3    1276   0.0
15:06:31  28  6.3   -82 44.4    26.7  -106.7  110.0                                69.3    74.6     5.8    3.4   17.0    -0.0    1287   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 15

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

15:07:00  28  4.8   -82 43.9    25.9  -100.7  104.0  167.3    1.0    2.0   879.0   61.8    64.7     0.1   23.4   22.0    -9.1    1263   0.0
15:07:01  28  4.3   -82 43.9    25.6  -100.7  103.9  167.4    1.0    1.9   881.4   61.9    62.1     1.9  -10.3   22.5    -8.5    1250   0.0
15:07:01  28  4.7   -82 43.9    26.1  -100.7  104.0                                62.3    67.0    -1.9    1.0   17.1    -0.0    1276   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:07:30  28  3.2   -82 43.4    25.2   -95.3   98.6  166.6    3.1    0.7   881.2   55.5    58.4     0.1   21.3   21.8    -8.7    1239   0.0
15:07:31  28  2.8   -82 43.4    24.9   -95.3   98.5  166.6    3.1    0.6   883.6   55.6    56.4    11.0   -5.1   22.1    -8.5    1227   0.0
15:07:31  28  3.2   -82 43.5    25.2   -95.5   98.8                                55.9    60.9     1.8    2.1   17.2    -0.0    1259   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:08:00  28  1.7   -82 42.9    30.3   -92.5   97.3  163.4    3.0   -1.2   882.1   53.8    56.5     0.1   23.4   21.7   -10.4    1228   0.0
15:08:01  28  1.2   -82 42.9    30.0   -92.4   97.2  163.4*   2.9   -1.4   884.3   53.8    54.5     9.2   -5.7   21.8   -10.1    1215   0.0
15:08:01  28  1.6   -82 43.0    30.3   -92.4   97.3                                54.2    58.9     0.7    1.7   17.3    -0.0    1249   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:08:30  28  0.2   -82 42.4    31.6   -94.1   99.3  163.9    3.3    0.6   880.1   56.5    59.2     0.1   22.4   21.7    -8.6    1263   0.0
15:08:31  27 59.7   -82 42.4    31.3   -94.1   99.2  163.9    3.3    0.5   882.3   56.6    56.6     7.3   -7.0   22.1    -8.6    1253   0.0
15:08:31  28  0.1   -82 42.4    31.8   -94.1   99.3                                56.9    61.7    -8.5   -1.2   17.4    -0.0    1266   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:09:00  27 58.6   -82 41.8    23.2  -103.1  105.7  169.0    2.1    1.3   895.8   63.9    66.9     0.1   23.0   23.0   -10.5    1116   0.0
15:09:01  27 58.1   -82 41.8    22.9  -103.1  105.6  169.0    2.1    1.1   898.4   63.9    64.0     6.9   -8.5   23.5   -10.5    1107   0.0
15:09:01  27 58.5   -82 41.9    23.3  -103.2  105.8                                64.3    69.5    -5.9   -0.2   18.0    -0.0    1115   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:09:30  27 56.9   -82 41.5    17.4   -99.5  101.1  170.9    2.5    0.4   897.0   59.1    61.9     0.1   21.7   22.7   -10.6    1110   0.0
15:09:31  27 56.5   -82 41.5    17.2   -99.5  101.0  170.9    2.5    0.3   899.5   59.2    59.8     6.1   -7.9   23.3   -10.5    1102   0.0
15:09:31  27 56.8   -82 41.5    17.4   -99.6  101.1                                59.5    64.5     1.5    1.8   18.0    -0.0    1106   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:10:00  27 55.4   -82 41.1    18.9   -94.0   95.9  169.9    3.6    0.0   897.2   52.9    55.6     0.1   21.7   22.5   -10.7    1109   0.0
15:10:01  27 54.9   -82 41.1    18.7   -93.9   95.8  170.0    3.6   -0.1   899.5   52.9    53.4    12.4   -4.1   22.7   -10.5    1102   0.0
15:10:01  27 55.3   -82 41.2    19.0   -94.0   95.9                                53.3    58.1    -3.6    0.3   18.2    -0.0    1107   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:10:30  27 53.9   -82 40.9     0.1   -93.9   94.0  181.1    3.4    3.6   897.0   51.3    54.0     0.1   23.6   22.5   -10.2    1105   0.0
15:10:31  27 53.4   -82 40.9    -0.1   -93.9   93.9  181.1    3.4    3.4   899.5   51.4    52.0    13.9   -3.3   22.5   -10.0    1098   0.0
15:10:31  27 53.8   -82 40.9     0.1   -93.9   93.9                                51.7    56.5    -3.1    0.5   18.0    -0.0    1106   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:11:00  27 52.3   -82 40.8     4.0   -96.8   96.9  178.5    2.8    0.4   897.6   54.4    56.9     0.1   23.3   22.5    -9.5    1099   0.0
15:11:01  27 51.9   -82 40.8     3.7   -96.7   96.8  178.6    2.8    0.3   899.7   54.4    54.9     8.3   -6.2   22.8    -9.4    1094   0.0
15:11:01  27 52.2   -82 40.9     4.0   -96.7   96.8                                54.8    59.5    -2.8    0.6   18.2    -0.0    1104   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:11:30  27 50.8   -82 40.8     3.2   -92.4   92.4  179.0   -0.2    0.2   900.1   49.9    52.2     0.1   22.8   22.1   -10.6    1078   0.0
15:11:31  27 50.3   -82 40.8     3.0   -92.2   92.3  179.1   -0.3    0.0   902.0   50.0    49.8     1.8   -8.5   22.6   -10.5    1069   0.0
15:11:31  27 50.7   -82 40.8     3.4   -92.4   92.4                                50.3    54.2    -4.0    0.0   18.1    -0.0    1082   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 16

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

15:12:00  27 49.3   -82 40.7     2.9   -91.2   91.3  179.4   -1.8   -0.5   919.0   49.4    51.5     0.1   25.5   22.3    -2.1     889   0.0
15:12:01  27 48.9   -82 40.7     2.7   -91.1   91.1  179.4   -1.8   -0.6   920.7   49.5    49.2     4.5   -7.2   22.8    -3.5     883   0.0
15:12:01  27 49.2   -82 40.8     2.9   -91.2   91.2                                49.8    53.7    -4.0    0.0   18.7    -0.0     907   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:12:30  27 47.8   -82 40.6    15.5   -84.6   86.0  170.0    2.9  -14.0   933.2   46.4    48.5     0.1   27.1   21.6    12.3     757   0.0
15:12:31  27 47.4   -82 40.6    15.3   -84.5   85.9  170.0*   2.9  -14.2   934.8   46.4    46.2    10.1   -4.4   21.7    12.5     754   0.0
15:12:31  27 47.7   -82 40.7    15.2   -84.8   86.2                                46.7    50.8    -9.2   -1.8   17.8    -0.0     779   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:13:00  27 46.8   -82 39.8    76.6   -37.8   85.5  119.2   -1.1  -15.0   945.8   46.3    47.7     0.1   24.8   21.2    14.5     648   0.0
15:13:01  27 46.4   -82 39.8    76.4   -37.7   85.2  119.2*  -1.1  -15.2   946.8   46.3    46.2    -0.3   -9.1   21.6    13.5     643   0.0
15:13:01  27 46.7   -82 39.8    76.5   -38.3   85.6                                46.6    50.4    -2.5    0.2   18.1    -0.0     665   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:13:30  27 46.7   -82 38.3    83.5     7.4   83.8   90.1   -1.7    2.1   954.0   41.4    43.4     0.1   25.1   21.3    15.3     577   0.0
15:13:31  27 46.2   -82 38.3    83.2     7.6   83.6   90.1   -1.6    2.0   955.7   41.4    42.0     1.3   -7.4   21.7    14.5     570   0.0
15:13:31  27 46.6   -82 38.3    83.6     7.6   83.9                                41.7    45.5     0.7    1.3   18.5    -0.0     588   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:14:00  27 46.8   -82 36.8    79.3    12.5   80.3   87.5    2.1    4.4   962.6   37.8    39.9     0.1   21.6   22.0    15.8     511   0.0
15:14:01  27 46.4   -82 36.8    79.1    12.6   80.1   87.6*   2.1    4.3   964.5   37.8    38.5     8.4   -3.7   22.2    15.4     505   0.0
15:14:01  27 46.7   -82 36.8    79.4    12.8   80.5                                38.1    42.1    -2.7    0.4   19.1    -0.0     509   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:14:30  27 47.1   -82 35.4    73.7    30.8   79.9   73.2    2.2   -7.4   966.2   35.7    37.1     0.1   21.6   22.0    16.4     484   0.0
15:14:31  27 46.7   -82 35.4    73.5    31.0   79.7   73.2*   2.1   -7.5   967.7   35.7    36.5     7.0   -3.9   22.1    15.8     477   0.0
15:14:31  27 47.0   -82 35.4    73.8    30.6   79.9                                35.9    39.8    -0.9    0.6   19.0    -0.0     479   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:15:00  27 48.0   -82 34.2    58.1    67.8   89.3   47.3   -1.6    1.0   982.4   42.2    44.0     0.1   21.7   23.1    17.1     333   0.0
15:15:01  27 47.6   -82 34.2    57.9    68.0   89.3   47.4*  -1.6    0.8   984.2   42.2    42.3     0.4   -8.1   23.6    16.8     331   0.0
15:15:01  27 47.9   -82 34.2    58.2    68.0   89.5                                42.5    46.2    -5.5   -0.5   19.8    -0.0     336   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:15:30  27 49.1   -82 33.2    53.5    69.7   87.8   43.6   -1.2    0.2   999.8   43.3    45.3     0.1   21.6   23.7    16.6     179   0.0
15:15:31  27 48.7   -82 33.2    53.3    69.9   87.9   43.6   -1.1    0.0  1001.7   43.4    43.5     4.0   -6.8   24.2    16.6     179   0.0
15:15:31  27 49.0   -82 33.2    53.5    69.8   88.0                                43.6    47.6    -5.5   -0.5   20.5    -0.0     187   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:16:00  27 50.0   -82 32.2    46.8    53.3   70.9   44.0   -3.6    0.1  1013.2   32.3    33.5     0.1   21.4   21.8    15.4      64   0.0
15:16:01  27 49.7   -82 32.2    46.6    53.5   70.9   44.1   -3.6    0.0  1014.3   32.4    32.7    -4.1   -8.2   22.2    15.1      68   0.0
15:16:01  27 50.0   -82 32.3    46.9    53.3   71.1                                32.5    35.1     6.3    2.8   19.9    -0.0      70   0.0
00000000   0  0.0     0  0.0                                                                                                        0

15:16:30  27 50.8   -82 31.4    30.9    36.7   47.9   40.0   -2.4   -0.2  1020.8   15.4    17.1    -0.0   32.8   22.4    16.3       4   0.0
15:16:31  27 50.4   -82 31.4    30.7    36.9   48.0   40.1   -2.4   -0.3  1022.0   15.5    14.5    -3.9   -4.9   22.7    16.0       1   0.0
15:16:31  27 50.7   -82 31.5    30.9    37.1   48.3                                15.2    15.9     7.4    3.2   27.4    -0.0       6   0.0
00000000   0  0.0     0  0.0                                                                                                        0

Wed Sep 5 09:40:16 2001 Page 17

/acdata/hur01/980113H/rawprintout

A/C 42, Flgt  1/13/1998, Proj hur01 Run on Wed Sep  5 09:40:16 2001
TIME (INE1)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSW    PQF1     PQW     LW      RD    TT1    DW1    RA159   BT1
TIME (INE2)   LAT       LONG      GX      GY     GS     HD     PC     RL    PSF    PQF2     DAP     APF    APR    TT2    DW2    RA232   BT2
TIME(3MGPS)   LAT       LONG      GX      GY     GS   RTT3   RTT4   RTT5           PQF3     DBP     BPF    BPR     RS    DW3    3MGSP   BT3
TIME(ASGPS)   LAT       LONG                                                                                                    ASGSP

15:17:00  27 51.2   -82 31.1    12.2    14.2   18.7   40.3   -1.4   -0.1  1020.6    3.1     4.3    -0.0   32.7   20.7    16.1      19   0.0
15:17:01  27 50.8   -82 31.1    12.0    14.5   18.8   40.3*  -1.5   -0.3  1021.6    3.2     2.2     0.5   -0.6   21.1    16.0       1   0.0
15:17:01  27 51.1   -82 31.1    12.4    14.6   19.2                                 3.1     2.8     2.2    1.2   27.2    -0.0       9   0.0
00000000   0  0.0     0  0.0                                                                                                        0

*********************************************************************************************************************************************************************************************
ERROR COUNT:

*********************************************************************************************************************************************************************************************
LAT_INE1:  0
LAT_INE2:  0
LAT_3MGPS:  0
LAT_ASGPS:  0
LONG_INE1:  0
LONG_INE2:  0
LONG_3MGPS:  0
LONG_ASGPS:  0
DW1:  0
DW2:  0
DW3:  0
HDG_INE1:  0
HDG_INE2:  30
PITCH_INE1:  0
PITCH_INE2:  0
ROLL_INE1:  0
ROLL_INE2:  0
PS_INE1:  0
PS_INE2:  0
PQ:  0
PQF1:  178
PQF2:  86
DAP:  0
DBP:  0
TT1:  0
TT2:  0
RA159:  769
RA232:  1
APF:  0
APR:  0